arXiv:0905.4017v1 [cond-mat.mtrl-sci] 25 May 2009

∗Corresponding author; email: egutsmie@e18.physik.tu-muenchen.de

Density of states in solid deuterium: Inelastic neutron scattering study

A. Frei, E. Gutsmiedl^∗, C. Morkel, A.R. Müller, S. Paul, M. Urban Technische Universität München, Physik-Department, James-Franck-Str., D-85747 Garching, Germany

H. Schober, S. Rols Institut Laue Langevin, 156X, F-38042 Grenoble CEDEX, France

T. Unruh Technische Universität München,Forschungsneutronenquelle Heinz Maier-Leibnitz (FRM II), Lichtenbergstr. 1, D-85747 Garching, Germany

M. Hölzel Technische Universität Darmstadt, Material-und Geowissenschaften, Petersenstr. 23, D-64287 Darmstadt, Germany (Dated: November 6, 2019)

Abstract

The dynamics of solid deuterium (sD_2) is studied by means of inelastic scattering (coherent and incoherent) of thermal and cold neutrons at different temperatures and para-ortho ratios. In this paper, the results for the generalized density of states (GDOS) are presented and discussed. The measurements were performed at the thermal neutron time-of-flight (TOF) instrument IN4 at ILL Grenoble and at the cold neutron TOF instrument TOFTOF at FRM II Garching. The GDOS comprises besides the hcp phonon excitations of the sD_2 the rotational transitions J = 0 → 1 and J = 1 → 2. The intensities of these rotational excitations depend strongly on the ortho-D_2 molecule concentration c_o in sD_2. Above E = 10 meV there are still strong excitations, which very likely may originate from higher energy damped optical phonons and multi-phonon contributions. A method for separating the one- and multi-phononon contributions to the density of states will be presented and discussed.

PACS numbers: 28.20.Cz, 63.20.kk Keywords: neutron, phonons, solid deuterium

I. INTRODUCTION

Solid deuterium (sD_2) and solid hydrogen are typical quantum molecular solids. Each D_2/H_2 molecule exhibits large zero-point vibrations due to the small molecule mass. These quantum solids have been investigated theoretically [1] and by experimental techniques like inelastic neutron scattering [2] and Raman scattering [3]. Solid deuterium has an almost perfect hcp crystal structure, when it is prepared under suitable conditions [4] (low pressure and T > 5 K). The phonon dispersion relation of solid ortho-deuterium (o-D_2) was measured in the past by inelastic coherent neutron scattering [5]. These measured phonon dispersion relations are in good agreement with recent calculations based on molecular dynamics calculations (MDC) [1]. In the case of solid para-hydrogen, the molecular calculations [1] disagree to some extent with the experimental data of Nielsen [2]. The MDC predicts phonons above 10 meV in solid para-hydrogen, which did not appear in the neutron scattering measurements of Nielsen [2]. One possible explanation could be the restriction to energies below 9 meV in Nielsen’s data analysis [1]. Recent inelastic incoherent neutron scattering data on solid para-hydrogen [6] are showing also excitations above 10 meV.

The D_2 molecule has internal rotational modes, which are described by the rotational quantum number J. In the solid phase, J is still a good quantum number. Deuterium in states with even J (J=0,2,4....) is termed ortho-deuterium (o-D_2), whereas D_2 in states with odd J (J=1,3,5,.....) is termed para-deuterium (p-D_2). At low temperatures (T ∼ 6 K), about 99.999% of the deuterium molecules are in the ortho state, when thermal equilibrium is reached. At room temperature, D_2 has an ortho concentration of 66.7%. After cooling down the D_2 to the solid phase (T ∼ 6 K), it normally takes months to reach the equilibrium of 99.999% o-D_2. This process can be accelerated by using paramagnetic materials like chromium oxides or hydrous ferric oxides [7, 8, 9] as catalysts for the para-ortho conversion. With this kind of converters, it is possible to reduce the conversion time to below one day in typical experiments and to adjust the o-D_2 concentration between 66.7% and >= 98% for investigating in detail its influence on the structure and dynamics of solid deuterium.

Neutron scattering is an excellent tool to investigate the phonon system and the rotational transitions of D_2 molecules in sD_2. Neutrons are scattered by D coherently (b_{coh} = 6.671 fm) and also incoherently (b_{inc} = 4.04 fm) [10]. Scattering of neutrons where a rotational transition (J → J^′, J ≠ J^′) is involved, leads to an incoherent response of the system. The phonon excitations are present in the coherent part of the scattering, whereas the incoherent part is determined by rotational transitions and also by incoherent phonon scattering [11, 12].

In principle the cross section for neutron scattering in sD_2 is described by,

∂^2σ ∂ω∂Ω = k k_0 b_{coh}^2S_{coh} (Q, ω) + k k_0 b_{inc}^2S_{inc} (Q, ω). (1)

Here, k_0 is the wave number of the incoming neutron, k the wave vector of the scattered neutron, S_i (Q, ω) (i =coh, inc) are the dynamical structure functions of coherent and incoherent scattering, respectively. The energy change of the neutron is E = ℏω , while ℏQ is the momentum transfer. The coherent and incoherent scattering lengths are b_{coh} and b_{inc} respectiveley.

In the incoherent approximation the neutron scattering cross section Eq. (1) can be expressed by [13]:

∂^2σ ∂ω∂Ω = k k_0

[b_{eff} (Q)]^2 ℏQ^2 2M G(ω) ω [n(ω) + 1] e^{−2W (Q)}. (2) The generalized density of states (GDOS) G(ω) comprises the complete phonon excitations of sD_2 as well as rotational transitions of individual D_2 molecules. Furthermore, multi-phonon excitations of the phonon system of sD_2 [14] should appear in the GDOS, as they are not corrected for in Eq. (2). The term e^{−2W (Q)} is the well known Debye-Waller factor, where W (Q) =^1_6 Q^2⟨u^2⟩, and ⟨u^2⟩ (⟨u^2⟩ = 0.25 Å^2) is the mean square displacement [5] of the D_2 molecule in the lattice. The quantity n(ω) is the Bose statistic function, and [n(ω) + 1] describes the creation of a boson, which causes the neutron energy loss. The scattering length b_{eff} (Q) is a combination of coherent and incoherent scattering lengths. This combination depends strongly on the rotational transitions excited by the neutrons [12] (see TABLE I).

Factorization (Eq. (2)) is only applicable, if the total scattering response of solid deuterium contains an essential amount of incoherent scattering (incoherent approximation), or if averaging over a sufficiently large Q range is performed. This is the case for thermal neutron scattering.

TABLE I: Neutron scattering lengths b associated with rotational transitions [12]. J → J̃ E [meV] b^2 0 → 1 7.0 0.375 b^2_{inc} 1 → 2 13.5 0.75 b^2_{inc} 0 → 2 21.0 b^2_{coh} + 0.625b^2_{inc} 1 → 0 7.0 0.75b^2_{inc}

In principle, [b_{eff} (Q)]^2 is expressed by

[b_{eff} (Q)]^2 = (1 − c_p) · [ 4 ( b^2_{coh} + 5 8 b^2_{inc} ) j^2_0 (Qa_s/2) ]

+ (1 − c_p) · [ 9 2 b^2_{inc} ( j^2_1 (Qa_s/2) ) ]

+ c_p · [ 3b^2_{inc} ( 2j^2_1 (Qa_s/2) + 3j^2_3 (Qa_s/2) )] + c_p · [ (4b^2_{coh} + b^2_{inc}) ( j^2_0 (Qa_s/2) + 2j^2_2 (Qa_s/2) )] ,

(3)

where j_i(Q · a_s/2) are the spherical Bessel functions of order i. The first term in Eq. (3) describes the transition J = 0 → 0 (even-even), while the second term the J = 0 → 1 (even-odd) transition. The third and fourth term take the J = 1 → 2 (odd-even) and J = 1 → 1 (odd-odd) transition into account. The parameter a_s = 0.74 Å is the distance of the deuterons within the D_2 molecule [5], while c_p is the concentration of the molecules in the para state (c_p + c_o = 1, c_o is the concentration of molecules in the ortho state).

With the measured inelastic neutron cross section and Eq. (2), it is possible to determine the GDOS. The GDOS for differently prepared sD_2 crystals with different ortho concentrations are the main subject of this paper. Furthermore, a methode of extracting the density of states of one-quasi-particle excitations G_1(E) from our data is presented. A detailed analysis of the dynamical and static structure of solid deuterium will be presented in a forthcoming publication.

II. EXPERIMENTAL DETAILS

The experiments on inelastic neutron scattering were performed at the Time-Of-Flight (TOF) spectrometer for thermal neutrons IN4 [15] of the Institute Laue-Langevin (ILL), Grenoble, France and at the cold TOF spectrometer TOFTOF [16] at FRM II, Garching, Germany.

The measurements at IN4 were carried out at two different wavelengths of the incoming neutrons (λ ≃ 2.2 Å and 1.1 Å). The energy resolution for the two different wavelengths had been determined to be ΔE_{2.2} = 0.7 meV and ΔE_{1.1} = 3.4 meV, using the standard technique of elastic neutron scattering on a vanadium sample.

The IN4 spectrometer supplies a typical thermal neutron flux of 5 · 10^5 cm^{−2} s^{−1} on the sample. The beam size on the sample is ∼ 2×4 cm^2. The scattering angle 2θ varies between 13^∘ and 120^∘. The beam divergence is Δθ = 1^∘.

The sample cell for the solid deuterium was designed and constructed to fit into the standard ”orange cryostat” of ILL [17]. The sample cell is cooled down to the desired temperature by using an exchange gas (helium) in the chamber which surrounds the sample cell. The cooling inside the cryostat is done by a liquid-nitrogen shield and a liquid-helium heat exchanger. Neutron scattering on solid/liquid deuterium was performed at temperatures between T = 3.5 K and T = 23 K. The temperature stability was better than 0.1 K.

The sD_2 is frozen inside the double-wall cylinder volume (see Fig. 1). The thickness of the sD_2 in the cell is fixed to δ = 2 mm. The attenuation of the incoming thermal neutrons (E_0 ∼ 17 meV) in the filled sample cell is ∼ 25%, and therefore multiple neutron scattering inside the sample can not be neglected. The influence of multiple scattering will be discussed in detail in the section ”Results and discussion”. The sample cell is connected to the D_2 gas handling system via a 12 mm×1 mm stainless steel pipe.

The gas handling system is especially designed to keep the pressure of the D_2 gas flow into the sample cell quasi-independent of the temperature within the cell. This is done by using needle valves for the gas flow. With this technique, it is possible to follow a special path in the phase diagram (see Fig. 2) of D_2. This can be either the path from the gas via the liquid to the solid phase, or the path directly from the gas to the solid phase (sublimation). The triple point of D_2 is at [T_t = 18.7 K, P_t ∼ 180 mbar]. At pressures below P_t, direct sublimation of D_2 is possible, while at pressures above P_t, the D_2 is liquefied before it becomes a solid.

The para-to-ortho converter [9], which accelerates the conversion from the p-D_2 to o-D_2 state (Fig. 3), is attached to the gas handling system via a stainless-steel pipe. This converter is an independent cryogenic system, cooled by a cold finger. The main part of this system is a copper cup, filled with a paramagnetic powder. This powder was extracted from an OXISORB [9] unit, which is normally a gas cleaning tool. OXISORB contains paramagnetic chromium composition, which acts inside the converter as a catalyst. The upper part of the copper cup is closed by a sinter disc, which keeps the powder in the cup, but is permeable to D_2 gas. This copper cup is mounted on the finger of the cooling machine, and can be operated between T = 10 K and room temperature. During the filling mode, the cup is fed with D_2 gas from the gas handling system. The D_2 is liquified inside the cup, and is kept there at the boiling point for the necessary conversion time (hours). Keeping the liquid at the boiling point shortens the conversion time considerably (factor 2) [9].

The filling procedure of the sample cell was monitored with the help of the IN4 spectrometer. Filling was stopped when the scattered-neutron intensity reached its maximum and stayed constant. This method was used for filling natural deuterium gas from the dump and also for filling the converted deuterium gas from the converter unit.

The experiments at TOFTOF of FRM II were performed with an equipment similar to that used at IN4. These experiments were performed before the IN4 experiment and served to optimize the sample cell for the IN4 experiment. Sample cell and cooling machine at the TOFTOF experiment were different from the setup at IN4. The thickness of the sD_2 in the cell was bigger than that (δ = 3 mm) in the IN4 sample cell. The attenuation of the incoming thermal neutrons (E_0 ∼ 20 meV, λ ≃ 2.0 Å) in the filled sample cell is ∼ 30%, and therefore multiple neutron scattering inside the sample can not be neglected. The influence of multiple scattering will be discussed in detail in the section ”Results and discussion”. Later, after the IN4 experiment, a second experiment was done with sD_2 at the TOFTOF, in order to improve the statistics of neutron data for energy transfers larger than 10 meV.

The sample cell at TOFTOF is cooled by a closed cycle cold-head machine with He exchange gas. With this setup temperatures down to T ∼7 K were reached. The measurements at TOFTOF were carried out at three different wavelengths of the incoming neutrons (λ ≃ 2.0 Å , λ ≃ 2.6 Å and λ ≃ 6.0 Å). The energy resolution for the different wavelengths has been determined to ΔE_{2.0} = 1.23 meV, ΔE_{2.6} = 0.74 meV and ΔE_{6.0} = 0.07 meV, using the standard technique of elastic neutron scattering on a vanadium sample. At TOFTOF the typical cold neutron flux on the sample amounts to 7 · 10^4 cm^{−2} s^{−1}. The beam size on the sample is ∼ 3 × 5 cm^2. The TOFTOF detector bank covers a range of 2θ = 7.5^∘ ... 140^∘. The beam divergency is Δθ ∼ 1^∘.

III. SAMPLE PREPARATION

The structure and dynamics of sD_2 may be influenced by the way of preparing the crystals [18, 19]. Therefore samples of different character were prepared by different freezing procedures. Our own experiments had shown differences in the optical quality of D_2 for different freezing procedures (see Fig. 4).

Freezing experiments with p-sH_2 and o-sD_2 films on MgF_2 coated sapphire plates [19] showed very interesting features concerning the microscopic and mesoscopic structure of solid deuterium and hydrogen films. Below T_d < 6 K (deposition temperature) a mixture of hcp and fcc structures is possible in the sD_2 film. The fcc component disappears if the temperature is raised above 9.5 K (annealing). The remaining hcp structure is preserved, even if the temperature is lowered again below 9.5 K. These observations were one motivation to look for a possible influence of the freezing procedure on the structure and dynamics of sD_2. The following freezing procedures were applied:

Liquid-Solid (LS): D_2 is liquefied in the sample cell at T ∼21 K. The filling is monitored by neutron scattering measurements at IN4. After filling, the temperature of the cooling controller is lowered to a temperature slightly below T = 18.7 K and kept constant, the sample starts to freeze slowly. The sD_2 sample is then cooled down slowly to the desired measurement temperature. Slow cooling of the sD_2 is necessary to avoid sudden cracking of the solid deuterium.

Liquid-Solid-Melt-Solid (LSMS): An alternative method of producing good samples of sD_2 is remelting the solid at T = 18.7 K. When the solid is melting, a mixture of liquid and small pieces of solid deuterium crystals will emerge. The character of this mixture can be monitored by neutron-scattering measurements. The static structure factor indicates the crossover from solid/liquid to complete liquid. The basic idea of this method is to stop the melting shortly before all solid pieces of sD_2 disappear. The remaining solid fragments serve as crystallization seeds for a new solid-deuterium sample.

Gas-Solid (GS): The re-sublimation of deuterium from gas is done be keeping the sample-cell temperature at T ∼ 7 − 9 K and maintaining a constant gas flow. With this method it is possible to grow slowly a solid-deuterium sample in the cell. How far the cell is filled with solid material is again monitored by neutron-scattering measurements.

Turbo Solid (TS): Fast freezing of sD_2 from the liquid phase at a temperature below T ∼ 10 K is leading to an opaque solid-deuterium sample (see Fig. 4c). The analysis of the static structure, extracted from the neutron scattering data, shows an almost ideal powder diffraction pattern for this ”turbo solid”. A detailed analysis of the structure of sD_2 will be presented in a forthcoming paper.

IV. RESULTS AND DISCUSSION

The TOF data were corrected for the empty-cell measurements, and normalized to the incoming flux and the vanadium standard. Based on this data the GDOS were determined by the IN4 computer code gdos. This code is implemented in the data analysis package LAMP [20], which is used for treating the data obtained from neutron scattering experiments at ILL. The basic method of this calculation is a sampling over a large Q range (neutron energy loss side), using the incoherent approximation [21] and referring to Eq. (2). The GDOS is calculated by:

GDOS(ω) = ω · S(Q(< 2θ >), ω) Q^2 · (n + 1) (4)

The term Q(< 2θ >) is a Q value for each energy transfer ℏω considering an averaged scattering angle < 2θ >. This simple approximation for the GDOS is commonly not equal to the real density of states (DOS). In many cases the agreement between the GDOS and DOS is remarkable. The GDOS incorporates the one-phonon and multi-phonon excitations. In the first order it is not so easy to separate the one-phonon part from the multi-phonon part. Nevertheless the GDOS is a useful tool to investigate the spectrum of excitations of the sample.

The experimental values of the GDOS for natural deuterium (o-D_2 66.7%) in the liquid and also in the solid phase for different preparation methods of the crystals are shown in Fig. 5. The data for almost pure (c_o = 95%) o-D_2 are shown in Fig. 6.

The GDOS for differently prepared crystals at the same o-D_2 concentration does not show variations, beyond statistical effects. It seems that the way of preparing the crystals does not change the spectra of phonon excitations in sD_2. The main difference between the GDOS for different o-D_2 concentrations is the strength of the rotational transition J = 0 → 1. Increasing the o-D_2 concentration enhances this transition. The GDOS shows for both o-D_2 concentrations a peak at E =12..13 meV. Furthermore, at c_o = 66.7% there is a hint for the rotational transition J = 1 → 2. This excitation is not visible for c_o = 95%.

An example for the influence of the o-D_2 concentration c_o on the rotational transitions is shown in Fig. 7. These data are taken from the later TOFTOF measurements (λ ≃ 2.0 Å).

It is evident that increasing c_o leads to a larger cross section for the J = 0 → 1 transition and also to a decrease of the J = 1 → 0 transition.

The main focus of the data analysis presented here is the extraction of the density of states (DOS) G_1(E) of phonons and rotational transitions in solid D_2 (”quasi particle picture”). The basic idea is to compare the integral over the scattering angle of the neutron scattering data dσ/dE_f with a calculated neutron cross section, using the incoherent approximation developed by Turchin [22] for a cubic crystal with one atom in the primitive cell. With the aid of this theory, it is possible to calculate the one-phonon and multi-phonon contributions to the neutron cross section dσ/dE_f , if G_1(E) is known.

This approach is only valid, if the detected neutrons are scattered neutrons from all possible directions of the first Brillouin zone in the crystal. This is normally the case, if one has a powder sample of the crystals. The diffraction pattern of fast frozen deuterium (TS, c_p=33.3%, T=9.5K) shows an powder like behavior, although some small texture effects are visible (see Fig. 8). A Rietveld fit on this diffraction pattern gives the right values [23] for a and c of a hcp solid deuterium crystal (a =3.596 +/- 0.005 Å, c =5.860 +/- 0.009 Å). The positions of the different Bragg peaks correspond to a hcp solid D_2 crystal.The fitmodel contains also the Debye-Waller factor, because at larger scattering angles (higher Q-values) the scattering intensity is significantly reduced. The fit result for the mean square displacement < u^2 >=0.208 +/- 0.011 Å^2 is smaller compared to value reported by Nielsen [5]. These results induced the decision to use only data from TS samples (second TOFTOF measurement) to determine the density of states G_1(E).

σ_s(E_i → E_f ) = ∞∑ n=1 σ_n(E_i → E_f ), (5)

dσ_n dE_f = σ_0(Q) ( 1 + 1 μ )_2 √ E_f E_i f_n(ϵ) n! F_n(E_i, E_f ). (6)

σ_0(Q) = 4π · [b_{eff} (Q)]^2 (7) The summation over the index n (number of quasi particles involved in the scattering) contains all higher-order multi-quasi-particle excitations like multiphonons. With E_i and E_f are the energy of the incoming and outgoing neutron in the scattering process, respectively, μ is the mass number of the D_2 molecule (μ = 4) and ϵ is the energy transfer (E = E_i − E_f ) to the scattered neutron.

f_n(E) = ∫_{+∞} −∞ f_{n−1}(E^′)f(E − E^′)dE^′, (8)

f(E) = G_1(|E|) E (1 − e^{−E/kBT} ) (9) The function f(E) (see (Eq. (9)) contains the density of states G_1(E), and it is possible to calculate the higher order functions f_n(E) with the help of Eq. (8).

F_n(E_i, E_f ) = μ 4 √ E_iE_f ∫_(^√_{Ei+}√_{Ef )/μ} ( √ E_i− √_{Ef )/μ} x^ne^{−x/τ} dx (10)

τ = (∫_∞ 0 1 E coth ( E 2k_BT ) G_1(E)dE )_{−1} (11) In Eq. (10) F_n(E_i, E_f ) is a kinematic factor, resulting from the integration over all angles in the neutron scattering process. The quantity τ is the average energy of the excitations (mainly phonons) in sD_2.

The starting point of the determination of G_1(E) is a first-guess model for G_1(E), which should contain the phonons as well as the rotational transition J → J^′. Following the approach of Yu et al. [24] a model with seven Gaussian functions is used to parameterize G_1(E). The contribution of the three-particle excitations (dσ_3/dE_f ) was approximated by an additional Gaussian function.

G_1(E) = 7∑ l=1 α_l 1 √ 2πσ_l e^{− 12} (E−ϵl)2 (σl)2 (12)

Treating phonons and rotational transitions as independent excitations may be not strictly correct in the calculation of the multiphonon contribution, but an eventual correction would occur at the far end of the energy spectrum above E > 14 meV, which is not crucial important here.

The neutron cross section dσ/dE_f is calculated with Eqs. (5) - (12) and compared with the measured N_0 ·dσ_D/dE_f (N_0 is a normalization factor). The parameters [α_l, σ_l, ϵ_l; l = 1..7] are determined by minimizing the difference between measured and calculated cross section.

Multiple scattering is in the case of the TOFTOF measurement not negligible. The deuterium sample scatters approximately 25% of the incoming beam. The scattering intensity is 50% elastic and 50% inelastic. The contribution of multiple scattering is a flat falling background (E >3 meV) and peak-like at E ∼0 meV. The multiple scattering was calculated (convolution of the scattering model with itself) by using the experimental deduced G_1(E) and applying the Turchin theory for one- and two-phonon neutron cross section. The magnitude ( 13%) of the multiple scattering was determined by using the work of V.F. Sears [25] (”rule of thumb” [26]). The flat falling background is smooth and has almost no texture. This background was included in the fit model, and cross checked afterwards with the convolution of dσ/dE with itself. The magnitude of multiple scattering, deduced from the fit must be in the same order, as predicted by the ”rule of thumb”-estimation.

The TOFTOF measurements (see Fig. 9) clearly show the onset of two-particle contributions above E ∼ 5 meV and also one-particle excitations above E = 10 meV. The TOFTOF data indicates three-particle excitations above E = 12 meV. The peak at E = 5 meV obviously originates from TA-phonons [2], whereas the peak at E ∼ 7.5 meV is a signature of the rotational transition J = 0 → 1.

Figure 10 shows the result for the one-particle density of states for solid D_2 at c_o = 66.7% and c_o = 98% (area normalized to 1). Part a) of Fig. 10 shows the convoluted G_1(E), while in part b) G_1(E) is de-convoluted with an Gaussian pseudo-resolution function with an F W HM =1.0 meV. This value was deduced from the F W HM of the elastic peak of dσ/dE. The influence of the ortho concentration c_o on the density of states G_1(E) manifests itself (Fig. 10) in the expected enhancement of the peak at E ∼ 7.5 meV for larger c_o. Increasing the number of ortho molecules in solid D_2 leads to a higher probability for J = 0 → 1 transition. The position of the J = 0 → 1 transition depends slightly on the concentration of para molecules c_p in the sD_2. A larger c_p lowers the J = 0 → 1 energy (δE ∼ 0.3 meV for c_p = 33.3%). This energy shift can be explained by the interaction between p-D_2 (J = 1) and o-D_2 molecules (J = 0) [4].

The DOS derived from our measurements differs remarkably from earlier published results [24], which used the phonon dispersion measurements of Nielsen [5] to calculate the DOS of solid D_2. The DOS published by Yu et al. [24] contains pronounced peaks at 5 meV and 9 meV, which were identified with the acoustic and optical phonons in the hcp crystal. The

J = 0 → 1 transition was not considered by Yu et al. [24], and the DOS vanishes above 10 meV. The optical phonon contribution of the actually measured DOS for c_p=33.3% seems to be smeared-out in the region of 8 − 12 meV, and does not peak at ∼ 9 meV, as it was published by Yu et al. [24]. This behavior was already observed in solid hydrogen by incoherent neutron scattering of Bickermann et al. [27] and Colognesi et al. [28] . Bickermann et al. explain the smearing-out of the higher-energy optical phonon groups by the anharmonicity of the quantum-crystal solid H_2. This anharmonicity leads to larger phonon line widths at higher energies. The DOS of Colognesi et al. shows at E ∼ 9−10 meV a small bumb, which could be identified as optic phonons in solid hydrogen. In the case of almost pure o-D_2 (c_p=2%) a peak at E ∼ 9 meV in the DOS was found in the fit of our data. The amplitude of this optical peak is smaller than as it was published by Yu et al.. The appearance of multiphonons above 5 meV in our measurements leads to considerable line widths of the phonon groups above this certain energy. Nielsen’s DOS was determined by a pseudoharmonic theory, which takes care of the renormalization of the phonon energies, but does not consider the change of the phonon line widths [27].

A second new feature of the result for G_1(E) presented here is a clear peak-like structure at E ∼ 12 meV. The intensity of this peak is more pronounced at higher c_o. This peak might be caused by the excitation of a combination of the rotational transition J = 0 → 1 (∼ 7.5 meV) and phonons with ∼ 5 meV energy. The DOS for phonons with ∼ 5 meV is very large. A combined excitation of phonons and rotational transitions of the D_2 molecules is certainly a result of the interaction of the rotational transitions with the lattice of the solid D_2 crystal (phonon-rotation coupling) [29]. A higher energy phonon (E > 12 meV) is able to excite a low energy phonon and also the rotational transition J = 0 → 1 through the phonon-rotation coupling. This decay of higher-energy phonons was maybe seen in our data. This peak could be on the other hand maybe an artefact, resulting from the incomplete separation of the one-particle-excitations and two-particle-excitations in the DOS, and has to be further investigated.

The DOS of solid D_2 with higher para concentration (c_p =∼ 33.3%, c_o ∼ 66.7%) contains a peak structure (see Fig. 10) at ∼ 14 meV, which is originated by the rotational transition J = 1 → 2. This peak is not seen at c_p = 2%, c_o = 98%. This effect is obvious, because the J = 1 → 2 transition scales with the number of para molecules in the solid D_2. The result for G_1(E) derived from our neutron scattering data can be used to calculate the mean square displacement < u^2 >. This value (< u^2 >=0.22 Å^2 for c_o ∼ 66.7%) is quite close to the result from the Rietveld fit on the neutron diffraction data of TS samples (c_o ∼ 66.7%, < u^2 >=0.208 Å^2), and smaller than the result reported by Nielsen [5]. In this context it is interesting to mention the recent published work of Bafile et al. [30], who reports on neutron diffraction measurements of solid deuterium close to melting. The mean square displacement increases to < u^2 >=0.43 Å^2 at T ∼18.7 K. The conclusion of Bafile et al. is the break down of the pseudoharmonic approach for solid deuterium close to the melting point.

V. CONCLUSION

In this manuscript, we reported investigations on the density of states (DOS) of solid D_2 for different o-D_2 concentrations with the powerful tool of neutron scattering. The experiments were performed at time-of-flight instruments at ILL, Grenoble and at FRM II, Garching. The DOS was extracted from the neutron data by applying the incoherent approximation. The results for the GDOS (generalized density of states) and the DOS show interesting details, which have not been published previously. One feature is the appearance of the J = 0 → 1 in the DOS. The strength of this excitation increases with the o-D_2 concentration c_o. The DOS of solid D_2 contains a strong phonon signal at 5 meV, but weak signals of optical phonons. Our results for the DOS indicate a smearing-out of the higher energy optical phonons for higher p-D_2 concentrations, which was also reported for solid hydrogen with high o-H_2 concentrations. The reason for this effect may be explained by the anharmonicity of the solid D_2 crystal. Furthermore we see two-phonon processes at considerably low energies in our data (onset at 5 meV). Another new result is the appearance of a peak at ∼ 12 meV in the DOS of solid D_2. This peak increases with higher o-D_2 concentration, and could be explained by a coupled excitation of a phonon and a rotational transition, or by an possible incomplete separation of the one- and two-particle-contribution. This effect has to be further investigated. Our data of natural deuterium (c_o ∼ 66.7%) are showing the rotational transition J = 1 → 2.

Acknowledgments

This work was supported by the cluster of excellence ”Origin and Structure of the Universe” Exc 153 and by the Maier-Leibnitz-Laboratorium (MLL) of Technische Universität München (TUM) and Ludwig-Maximilians-Universität (LMU). We thank T. Deuschle, H. Ruhland and E. Karrer-Müller for their help during the experiments and F. J. Hartmann for his helpful comments and notes concerning our manuscript.

[1] H. Saito, H. Nagao, K. Nishikawa, K. Kinugawa J. Chem. Phys. 119, 953 (2003). [2] H. Nielsen, Phys. Rev. B 7, 1626 (1973).

[3] A. Driessen, E. van der Poll, I.F. Silvera, Phys. Rev. B 30, 2517 (1984). [4] I.F. Silvera, Rev. Mod. Phys. 52 , 393 (1980). [5] H. Nielsen, B. Moeller, Phys. Rev. B 3, 4383 (1971).

[6] S.N. Ishmaev, G.V. Kobelev, I.P. Sadikov, V.A. Sukhoparov, A.A. Chernyshov, A.S. Telepnev, B.A. Vindryaevskii, Y.L. Shitikov, Physica B 234-236, 30 (1997).

[7] N.S. Sullivan, D. Zhou, C.M. Edwards, Cryogenics 30, 734 (1990).

[8] C.Y. Liu, S.K. Lanoreaux, A. Saunders, D. Smith, A.R. Young, Nucl. Instrum. Methods A 508, 257 (2003).

[9] A. Frei, A.R. Müller, D. Tortorella, E. Gutsmiedl, F.J. Hartmann, S. Paul, R. Hackl, L. Tassini, O. Spieler, Nucl. Instrum. Methods A , submitted (2008).

[10] http://www.ncnr.nist.gov/resources/n-lengths/ [11] S.W. Lovesey, Theory of Neutron Scattering from Condensed Matter 1, (Calderon, Oxford, 1984) 120.

[12] C.Y. Liu, A.R. Young, S.K. Lamoreaux, Phys. Rev. B 62, R3581 (2000). [13] G.L. Squires, Introduction to the Theory of Thermal Neutron Scattering , (Cambridge Univ.

Press, Cambridge, 1978) 57-9.

[14] F.G. Mertens, W. Biem, Z. Phys. 250, 273 (1972). [15] H. Mutka, Nucl. Instrum. Methods A 338, 144 (1994).

[16] T. Unruh, J. Neuhaus, W. Perty, Nucl. Instrum. Methods A 580, 1414 (2007). [17] http://www.ncnr.nist.gov/equipment/oc.html [18] D.P. Weliky, T.J. Byers, K.E. Kerr, T. Momose, R.M. Dickson, T. Oka, Appl. Phys. B 59, 265 (1994).

[19] G.W. Collins, W.G. Unites, E.R. Mapoles, T.P. Bernat, Phys. Rev. B 53, 102 (1996). [20] http://www.ill.eu/computing-for-science/cs-software/all-software/lamp/ [21] H. Schober, A. Tölle, B. Renker, R. Heid, F. Gompf, Phys. Rev. B 56, 5937 (1997). [22] V.F. Turchin, Slow Neutrons (Israel Program for Scientific Translations,Jerusalem,1965). [23] K.F. Mucker, P.M. Harris, David White, R.A. Erickson, J. Chem. Phys. 49, 1922 (1968).

[24] Z.-Ch. Yu, S.S. Malik, R. Golub, Z. Phys. B 62, 137 (1985). [25] V.F. Sears, Adv. Phys. 24, 1 (1975).

[26] G.E. Bacon, Neutron Diffraction , (Oxford, University Press,1962).

[27] A. Bickermann, H. Spitzer, H. Stiller, H. Meyer, R.E. Lechner, F. Volino, Z. Phys. B 31, 345 (1978).

[28] D. Colognesi, M. Celli, M. Zoppi, J. Chem. Phys. 120, 5657 (2004). [29] J. Van Kranendonk and V.F. Sears, Can. J. Phys 44, 313 (1966). [30] U. Bafile, F. Becherini, D. Colognesi,M. Zoppi, Phys. Rev. B 77, 224302-1 (2008).

Figure captions:

Fig. 1:

Sketch of the D_2 sample cell.

Fig. 2:

D_2 phase diagram with different process paths studied: a) liquefaction from the gas, b) solidification from liquid, c) sublimation at high temperature, d) direct condensation.

Fig. 3:

Sketch of the para-to-ortho converter [9]. The copper converter cup is filled with OXISORB grain, and mounted on the cold-finger of the cooling machine.

Fig. 4:

Pictures of solid deuterium samples for different freezing procedures. Crystals from the liquid phase are transparent, if they are frozen slowly, while a fast freezing/cool down (within minutes) leads to a non-transparent solid. a) solid deuterium slowly frozen from the liquid phase (LS), b) solid deuterium slowly frozen from the gas phase (GS), c) solid deuterium fast freezing/cool down from the liquid phase (TS).

Fig. 5:

Generalized density of states (GDOS) of natural deuterium (c_o = 66.7%): liquid D_2 (□) at T =21 K, solid D_2 (△), rapidly frozen out from the liquid phase and fast cooled down, solid D_2 (◯), slowly frozen out from the liquid phase, solid D_2 (⋆), slowly frozen out from the gas phase. All solids have a temperature of T =4 K. Peaks are convoluted with IN4 energy resolution curve: Normalized by ∫_∞ 0 GDOS(E) · dE = 1. Each GDOS is separated by a shift of 0.1. Fig. 6:

Generalized density of states (GDOS) of converted deuterium (c_o = 95%): liquid D_2 (□) at T =20 K, solid D_2 (△), slowly frozen out from the liquid phase, solid D_2 (◯), slowly frozen out from the gas phase, solid D_2 (⋆), frozen out at the melting point and slowly cooled down. All solids have a temperature of T =4 K. Peaks are convoluted with

IN4 energy resolution curve: Normalized by ∫_∞ 0 GDOS(E) · dE = 1. Each GDOS is separated by a shift of 0.1. Fig. 7:

Dynamical neutron scattering cross section of solid D_2 for c_o = 66.7% (□) and c_o = 98% (◯) at T = 7 K. Data from the TOFTOF measurements.

Fig. 8:

Neutron diffraction pattern data of fast frozen solid D_2 (TS) for c_o = 66.7% (△) at T = 9.5 K and comparison with a Rietveld fit (solid line) for powder like hcp solid D_2. Data from the TOFTOF measurements.

Fig. 9:

Dynamic neutron scattering cross section of solid D_2 for c_o = 66.7% and c_o = 98% at T = 7 K.

Comparison of data with calculated neutron cross sections.

The one-particle contribution is shown by the dashed line, the two-particle contribution by the dotted line, and the three-particle contribution by the dash-dotted line. Contribution of multiple scattering is shown by the dot-dot-dash line. Data from the TOFTOF measurements.

Fig. 10:

a) One-particle density of states of solid D_2 for c_o = 66.7% (◯), c_o = 98% (□) at T = 7 K. b) Comparison of de-convoluted DOS with data (⋆) from Yu et al. [24]. The DOS (part b)) are de-convoluted with the FWHM of the elastic peak of dσ/dE.

FIG. 1:

Sketch of the D_2 sample cell.

FIG. 2:

D_2 phase diagram with different process paths studied: a) liquefaction from the gas, b) solidification from liquid, c) sublimation at high temperature, d) direct condensation.

FIG. 3:

Sketch of the para-to-ortho converter [9]. The copper converter cup is filled with OXISORB grain, and mounted on the cold-finger of the cooling machine.

FIG. 4:

Pictures of solid deuterium samples for different freezing procedures.

Crystals from the liquid phase are transparent, if they are frozen slowly, while a fast freezing/cool down (within minutes) leads to a non-transparent solid.

a) solid deuterium slowly frozen from the liquid phase (LS), b) solid deuterium slowly frozen from the gas phase (GS), c) solid deuterium fast freezing/cool down from the liquid phase (TS).

FIG. 5:

Generalized density of states (GDOS) of natural deuterium (c_o = 66.7%): liquid D_2 (□) at T =21 K, solid D_2 (△), rapidly frozen out from the liquid phase and fast cooled down, solid D_2 (◯), slowly frozen out from the liquid phase, solid D_2 (⋆), slowly frozen out from the gas phase. All solids have a temperature of T =4 K. Peaks are convoluted with the IN4 energy resolution curve: Normalized by ∫_∞ 0 GDOS(E) · dE = 1. Each GDOS is separated by a shift of 0.1.

FIG. 6:

Generalized density of states (GDOS) of converted deuterium (c_o = 95%): liquid D_2 (□) at T =20 K, solid D_2 (△), slowly frozen out from the liquid phase, solid D_2 (◯), slowly frozen out from the gas phase, solid D_2 (⋆), frozen out at the melting point and slowly cooled down. All solids have a temperature of T =4 K. Peaks are convoluted with IN4 energy resolution curve: Normalized by ∫_∞ 0 GDOS(E) · dE = 1. Each GDOS is separated by a shift of 0.1.

FIG. 7:

Dynamical neutron scattering cross section of solid D_2 for c_o = 66.7% (□) and c_o = 98% (◯) at T = 7 K. Data from the TOFTOF measurements.

FIG. 8:

Neutron diffraction pattern data of fast frozen solid D_2 (TS) for c_o = 66.7% (△) at T = 9.5 K and comparison with a Rietveld fit (solid line) for powder like hcp solid D_2. Data from the TOFTOF measurements.

FIG. 9:

Dynamic neutron scattering cross section of solid D_2 for c_o = 66.7% and c_o = 98% at T = 7 K. Comparison of data with calculated neutron cross sections.

The one-particle contribution is shown by the dashed line, the two-particle contribution by the dotted line, and the three-particle contribution by the dash-dotted line. Contribution of multiple scattering is shown by the dot-dot-dash line. Data from the TOFTOF measurements.

FIG. 10:

a) One-particle density of states of solid D_2 for c_o = 66.7% (◯), c_o = 98% (□) at T = 7 K.

b) Comparison of de-convoluted DOS with data (⋆) from Yu et al. [24]. The DOS (part b)) are de-convoluted with the FWHM of the elastic peak of dσ/dE.