arXiv:0905.2699v1 [astro-ph.CO] 16 May 2009

The Araucaria Project. The Distance to the Sculptor Galaxy NGC 247 from Near-Infrared Photometry of Cepheid Variables^1

Wolfgang Gieren Universidad de Concepción, Departamento de Astronomia, Casilla 160-C, Concepción, Chile

Grzegorz Pietrzyński Universidad de Concepción, Departamento de Astronomia, Casilla 160-C, Concepción, Chile Warsaw University Observatory, Al. Ujazdowskie 4, 00-478, Warsaw, Poland

Igor Soszyński Warsaw University Observatory, Al. Ujazdowskie 4, 00-478, Warsaw, Poland

Olaf Szewczyk Universidad de Concepión, Departamento de Astronomia, Casilla 160-C, Concepción, Chile

Fabio Bresolin Institute for Astronomy, University of Hawaii at Manoa, 2680 Woodlawn Drive, Honolulu HI 96822, USA

Rolf-Peter Kudritzki Institute for Astronomy, University of Hawaii at Manoa, 2680 Woodlawn Drive, Honolulu HI 96822, USA

Miguel A. Urbaneja Institute for Astronomy, University of Hawaii at Manoa, 2680 Woodlawn Drive, Honolulu HI 96822, USA

Jesper Storm Astrophysikalisches Institut Potsdam, An der Sternwarte 16, D-14482 Potsdam, Germany

Dante Minniti Departamento de Astronomia y Astrofisica, Pontificia Universidad Católica de Chile, Casilla 306, Santiago 22, Chile

Alejandro García-Varela

1Based on observations obtained with the ESO VLT for Large Programme 171.D-0004

– 2 –

Universidad de los Andes, Departamento de Fisica, Bogotá, Colombia

ABSTRACT

We have obtained deep near-infrared images in J and K filters of four fields in the Sculptor Group spiral galaxy NGC 247 with the ESO VLT and ISAAC camera. For a sample of ten Cepheids in these fields, previously discovered by García-Varela et al. from optical wide-field images, we have determined mean J and K magnitudes and have constructed the period-luminosity (PL) relations in these bands. Using the near-infrared PL relations together with those in the optical V and I bands, we have determined a true distance modulus for NGC 247 of 27.64 mag, with a random uncertainty of ±2% and a systematic uncertainty of ∼4% which is dominated by the effect of unresolved stars on the Cepheid photometry. The mean reddening affecting the NGC 247 Cepheids of E(B-V) = 0.18 ± 0.02 mag is mostly produced in the host galaxy itself and is significantly higher than what was found in the previous optical Cepheid studies in NGC 247 of our own group, and Madore et al., leading to a 7% decrease in the previous optical Cepheid distance. As in other studies of our project, the distance modulus of NGC 247 we report is tied to an assumed LMC distance modulus of 18.50. Comparison with other distance measurements to NGC 247 shows that the present IR-based Cepheid distance is the most accurate among these determinations.

With a distance of 3.4 Mpc, NGC 247 is about 1.5 Mpc more distant than NGC 55 and NGC 300, two other Sculptor Group spirals analyzed before with the same technique by our group.

Subject headings: distance scale - galaxies: distances and redshifts - galaxies: individual(NGC 247) - stars: Cepheids - infrared photometry

1. Introduction

In our ongoing Araucaria project (Gieren et al. 2005a) we are improving various stellar standard candles as tools for precise distance measurements. The overall goal is a very accurate calibration of the distance ladder in the local Universe, out to perhaps 10 Mpc, which we hope to achieve by tracing down the age and metallicity dependences of the various standard candles we are investigating by comparative analyses of the distances

– 3 –

to the same targets we obtain from the different methods. This will lay the foundation for a truly accurate determination of the Hubble constant, reducing the uncertainty on Ho achieved by the HST Key Project on the Extragalactic Distance Scale (Freedman et al. 2001). The methods we use include Cepheid variables, via Period-Luminosity (PL) relations in the optical and infrared spectral domains (e.g. Pietrzynski et al. 2002; Gieren et al. 2005b), the K-band Period-Luminosity -Metallicity relation for RR Lyrae stars (e.g. Pietrzynski et al. 2008; Szewczyk et al. 2008), near-infrared magnitudes of red clump giants (e.g. Pietrzynski and Gieren 2002; Pietrzynski, Gieren and Udalski 2003), the Flux-Weighted Gravity-Luminosity Relation (FGLR) for blue supergiant stars (e.g. Kudritzki et al. 2008), and most recently late-type eclipsing binary systems in the LMC (Pietrzynski et al. 2009) which bear the potential to determine the LMC distance, as a crucial step in the distance ladder, with an accuracy of 1 %.

In this paper, we are using near-infrared observations of Cepheids in the spiral galaxy NGC 247 located in the nearby Sculptor Group, to determine an accurate distance to this galaxy which improves on the preliminary distance we had derived from optical (VI) data in a previous paper (García-Varela et al. 2008; hereafter Paper I). Infrared photometry has a number of distinct advantages over optical photometry for distance work with Cepheid variables. The most important gain is the very substantial reduction of the sensitivity of the observed Cepheid magnitudes to interstellar extinction. In addition, the intrinsic dispersion of the Cepheid PL relation becomes smaller towards the infrared region of the spectrum as compared to optical passbands, helping in obtaining more accurate distances. A further important advantage of the near-infrared domain is the fact that the mean magnitudes of Cepheid variables can be obtained with an accuracy of about 2 % from just one observation obtained at an arbitrary pulsation phase with the technique developed by Soszynski et al. (2005). This technique can be applied when an optical light curve (V and/or I) of a Cepheid, and its period, are known from a previous discovery survey, which has to be conducted in the optical spectral range in which Cepheid amplitudes are significantly larger than in the infrared, making their discovery much easier. In the Araucaria Project it has therefore been our strategy to discover the Cepheid populations in our Local and Sculptor Group target galaxies from wide-field imaging surveys in optical (BVI) bands, and select sub-samples of the detected Cepheid for follow-up observations in the infrared. We have shown in previous papers that a combination of the distance moduli derived in the optical VI and near-infrared JK bands leads to a very accurate determination of the true, absorption-corrected distance modulus of the host galaxy, and the mean color excess affecting its Cepheids (Gieren et al. 2008a,b; Soszynski et al. 2006; Gieren et al. 2006; Pietrzynski et al. 2006a; Gieren et al. 2005b). Generally, we have found in these previous studies that the intrinsic reddening found in the spiral, and even the smaller irregular Local

– 4 –

Group galaxies we have studied is larger than previously assumed by other authors, which has demonstrated that infrared work with its potential to virtually eliminate reddening as a significant source of systematic error is indeed imperative if one seeks to achieve distance accuracies in the 3-5% range, which is the aim of our project.

The principal properties of NGC 247 have been described in Paper I. At a distance of about 4 Mpc it is possible, using 8m-class telescopes, to obtain high-quality infrared photometry for the long-period Cepheid population we have detected in this galaxy (Paper I), and high-quality low-resolution spectra for its blue supergiant population as needed for the FGLR analysis (Kudritzki et al. 2008; Urbaneja et al. 2008). The Cepheid and blue supergiant methods of distance measurement can therefore be well compared on this galaxy.

Our paper is organized as follows. In section 2 we describe the near-infrared observations of the Cepheids in NGC 247, the data reductions, and the calibration of our photometry. In section 3 we derive the J- and K-band Cepheid PL relations in NGC 247 obtained from our data and determine the true distance modulus to the galaxy from a multiwavelength analysis. In section 4 we discuss our results, and in section 5 we summarize our conclusions.

2. Observations, Data Reduction and Calibration

We used deep J- and K-band images recorded with the 8.2 m ESO VLT equipped with the Infrared Spectrometer and Array Camera (ISAAC). Figure 1 shows the location of the four 2.5 x 2.5 arcmin fields observed in service mode during 7 nights between August 9 and November 18, 2005. The location of the fields was chosen in such a way as to maximize the number of Cepheids observed and optimize their period distribution. Fields 1, 2 and 4, were observed in both NIR bands two times, on two different nights, and therefore at different pulsation phases of the Cepheids in these fields. Field 3 was observed on a single night only.

The observations were carried out using a dithering technique, with a dithering of the frames following a random pattern characterized by typical offsets of 15 arcsec. In order to perform an accurate sky subtraction for our frames, we frequently observed random comparison fields located outside the main body of the galaxy, where the stellar density was very low, using the AutoJitterOffset template. The final frames in the J and K bands were obtained as a co-addition of 34 and 238 single exposures obtained with integration times of 30 and 15 s, respectively. Thus, the total exposure time for a given observation was 17 minutes in J and 57 minutes in K. The observations were obtained under excellent seeing conditions, typically around 0.5 arcsec. Standard stars on the UKIRT system

– 5 –

(Hawarden et al. 2001) were observed along with the science exposures to allow an accurate transformation of the instrumental magnitudes to the standard system.

The images were reduced using the program JITTER from the ECLIPSE package developed by ESO to reduce near-IR data. The point-spread function (PSF) photometry was carried out with the DAOPHOT and ALLSTAR programs. The PSF model was derived iteratively from 20 to 30 isolated bright stars following the procedure described by Pietrzynski, Gieren & Udalski (2002). In order to convert our profile photometry to the aperture system, aperture corrections were computed using the same stars as those used for the calculation of the PSF model. The median of the aperture corrections obtained for all these stars was finally adopted as the aperture correction for a given frame. The aperture photometry for the standard stars was performed with DAOPHOT using the same aperture as the one adopted for the calculation of the aperture corrections.

The astrometric solution for the observed fields was performed by cross-identification of the brightest stars in each field with the Infrared Digitized Sky Survey 2 (DSS2- infrared) images. We used programs developed by Udalski et al. (1998) to calculate the transformations between the pixel grid of our images and equatorial coordinates of the DSS astrometric system. The internal error of the transformation is less than 0.3 arcsec, but systematic errors of the DSS coordinates can be up to about 0.7 arcsec.

In order to perform an external check on our photometric zero points, we tried to compare the magnitudes of stars in the Two Micron All Sky Survey (2MASS) Point Source Catalog located in our NGC 247 fields with our own photometry. Unfortunately, even the brightest stars in our data set whose photometry is not affected by nonlinearity problems are still very close to the faint magnitude limit of the 2MASS catalog and have 2MASS magnitudes with formal errors of ∼0.2 mag. Moreover, all our NGC 247 fields are located in regions of high stellar density (see Fig. 1), and most of the 2MASS stars turn out to be severely blended, as seen at the higher resolution of our VLT ISAAC images. It was therefore not possible to carry out a reliable comparison of the two photometries. However, since our reduction and calibration procedure is extremely stable, and since the set of UKIRT standard stars observed is identical to the one used in our previous studies of NGC 300 (Gieren et al. 2005b) and NGC 55 (Gieren et al. 2008a), we should have achieved the same typical zero point accuracy we were able to achieve in our previous NIR studies of Local Group galaxies where a comparison with 2MASS magnitudes for a common set of stars was possible. From this argument, we expect that our photometric zero points are determined to better than ±0.03 mag in both J and K filters.

Our observed fields in NGC 247 contain a subset of ten of the 23 Cepheids we have previously discovered in NGC 247 (see Paper I). All individual observations in J and K

– 6 –

filters we obtained for these variables are presented in Table 1 which lists the star’s IDs, heliocentric Julian day of the observations, and the measured magnitudes in J and K with their respective standard deviations (as returned by DAOPHOT). For most of the Cepheids we collected two observations per filter. For four objects we obtained only one JK observation because of their location in field 3.

3. Near-infrared period-luminosity relations and distance determination

All individual J and K measurements reported in Table 1 were transformed to the mean magnitudes of the Cepheids using the recipe given by Soszynski et al. (2005). The corrections to derive the mean magnitudes from the observed random-phase magnitudes were calculated by taking advantage of the V-and I-band light curves of the variables from Paper I, exactly in the same way as described in the Soszynski et al. paper. For all Cepheids in the sample, the mean J and K magnitudes derived from the two individual observations at different pulsation phases agree very well. We were helped by the fact that the optical photometric observations in Paper I and the NIR follow-up observations reported in this paper were obtained relatively close in time (1-2 years), reducing the effect any inaccuracy in the periods of the Cepheids will have on the calculations of the phases of the more recent NIR data. For the Cepheids with two sets of JK observations obtained on different nights, the difference between the mean magnitudes calculated from the two independent random-phase JK observations was comparable to the standard deviations of the individual observations.

Table 2 gives the final intensity mean J and K magnitudes of the NGC 247 Cepheids we observed. The periods in the Table were taken from Paper I. The uncertainties on the mean magnitudes in Table 2 contain a 0.03 mag contribution coming from the transformation of the random phase to the mean magnitudes, as found appropriate in the study of Soszynski et al. (2005). In Fig. 2, we plot the positions of the Cepheids in Table 2 in the K, J-K Color-magnitude diagram for the stars in NGC 247. It is seen that the variables populate the expected region in the CMD and clearly delineate the Cepheid instability strip.

In Figures 3 and 4, we show the J-and K-band period-mean magnitude diagrams obtained from the data in Table 2. In both diagrams, the Cepheids define very tight PL relations. Least-squares fits to a line yield slopes of -2.96 ± 0.19 in the J band, and -3.19 ± 0.22 in the K band. Due to the relatively low number of Cepheids in these diagrams, the errors on the slopes are large, but the slope values agree within the uncertainties with the corresponding slopes on these diagrams determined for the LMC by Persson et al. (2004), which are (-3.153 ± 0.051) in J, and (-3.261 ± 0.042) in K, respectively. We are therefore

– 7 –

justified to apply the same procedure we have used in all our previous Cepheid IR studies, which is to adopt the extremely well-determined LMC PL relation slopes of Persson et al. in our fits to find the zero points from our data. Doing this, we obtain the following J- and K-band Cepheid PL relations in NGC 247:

J = -3.153 log P + (25.635 ± 0.039) σ = 0.12

K = -3.261 log P + (25.238 ± 0.040) σ = 0.13

In order to determine the relative distance moduli between NGC 247 and the LMC, we need to convert the NICMOS (LCO) photometric system used by Persson et al. (2004) to the UKIRT system used in this paper. According to Hawarden et al. (2001), there are just zero point offsets between the UKIRT and the NICMOS systems (e.g. no color dependences) in the J and K filters which amount to (0.034 ± 0.004) mag, and (0.015 ± 0.007) mag, respectively. Applying these offsets, and assuming a true distance modulus of 18.50 for the LMC as in our previous work in the Araucaria Project, we derive distance moduli for NGC 247 of 27.799 ± 0.038 mag in the J band, and 27.702 ± 0.04 mag in the K band. The quoted uncertainties are those from the fits and do not include systematic uncertainties, which will be discussed in the next section.

As in our previous papers in this series, we adopt the extinction law of Schlegel et al. (1998) to find R_λ (values given in Table 3) and fit a straight line to the relation (m − M)_0 = (m − M)_λ − A_λ = (m − M)_λ − E(B − V ) ∗ R_λ. Using the distance moduli for NGC 247 in the V and I photometric bands derived in Paper I, which are also given in Table 3, together with the values for the J and K bands derived above, we obtain from the least squares fit shown in Fig. 5 the following values for the reddening, and the absorption-corrected, true distance modulus of NGC 247:

E(B − V ) = 0.177 ± 0.020

(m − M)_0 = 27.644 ± 0.036

corresponding to a distance of NGC 247 of 3.38 ± 0.06 Mpc. The small uncertainties on both the reddening, and the true distance modulus derived from the fit in Fig. 5 demonstrate that these quantities are indeed very well determined by our data. The agreement between the true distance moduli obtained from the different bands, which are listed in Table 3, is excellent; in V, J and K the values differ less than 0.02 mag from the

– 8 –

adopted true distance modulus. Only in the I band the agreement is slightly worse (0.05 mag), but clearly within the error bar of this determination.

4. Discussion

The Cepheid distance to NGC 247 derived in this paper is in principle affected by a number of systematic uncertainties, which will now be discussed in turn. The most serious concern with Cepheid-determined distances to late-type galaxies is always with reddening. Classical Cepheids, as young stars, tend to be embedded in dusty regions in their host galaxies, which makes a precise determination of absorption corrections absolutely necessary. Since reddening is expected to be patchy and individual Cepheids can thus be expected to have widely different reddenings, the only way to reduce this problem is to include infrared photometry in the distance analysis, as we are doing in our project. With the results derived from the data in Table 3 we believe that any remaining uncertainty on the true distance modulus due to reddening is smaller than 0.03 mag, in agreement with the conclusions we had reached for the other target galaxies of the Araucaria Project whose distances were determined from Cepheid photometry in the VIJK bands (NGC 55, NGC 300, IC 1613, NGC 6822, WLM and NGC 3109; references as given in the Introduction of this paper). It is worthwhile mentioning that from Fig. 5 there is evidence that our assumed Galactic reddening law is valid, to a very good approximation, in NGC 247 as well. This is in agreement with our findings in the other spiral and irregular galaxies we have studied so far.

Very recently, Madore et al. (2009) have published a Cepheid distance to NGC 247 based on optical (VRI) CCD images obtained at the CTIO some 25 years ago. Their distance result of 27.81 ± 0.10 mag is in near-perfect agreement with our distance reported in Paper I based on the same filters (V and I). The mean reddening they derive for the Cepheids in NGC 247 from their data of E(V-I)=0.07 ±0.04, corresponding to E(B-V)=0.12, is also almost identical to our own value of E(B-V)=0.13 found in Paper I. Their sample of nine Cepheids contains six objects independently discovered in our own survey, and the light curve agreement is excellent for all common variables with the exception of one object, cep020 (P=65.862 days) in our catalog in Paper I. The long time difference between the Madore et al. and our own observing epochs indicates that both period, and the mean brightness of this peculiar Cepheid have changed over the past ∼25 years. This peculiar Cepheid is not contained in our present infrared-observed fields, and therefore not a source of systematic uncertainty in our present distance moduli derived in the J and K bands.

The excellent agreement of the results of Madore et al. (2009) with the results obtained

– 9 –

in Paper I is reassuring and constitutes a valuable external check of our own previous results from optical photometry. The inclusion of infrared photometry in this paper shows again (see previous papers in this series) that this is an absolutely essential step to determine the total Cepheid reddening with a truly high accuracy. The decrease of the true distance modulus of NGC 247 found in this paper as compared to Paper I, and the Madore et al. (2009) result, is just a consequence of an underestimate of the mean Cepheid reddening in both papers based on optical data alone which provide a wavelength base which is just too small, even with very good data, to assess the reddening with reasonable accuracy. This is also seen in Fig. 5; the slightly outlying distance modulus in I produced the smaller reddening, and larger distance modulus we had obtained in Paper I from the V and I data only.

As in the previous papers in our project, we have applied utmost care to determine the zero points of our photometry as accurately as possible. From the arguments given in section 2 and our previous experience we believe that the zero points are accurate to better than ±0.03 mag, in both J and K bands. An issue of concern is the crowding of stars in the images of NGC 247 which could cause significant blending for some of Cepheids, increasing their observed fluxes. To minimize this problem, we chose our observed fields in NGC 247 in the least crowded regions of the galaxy (see Fig. 1). Fortunately, our VLT images are of exquisite quality and the seeing during the exposures did never exceed 0.6 arcsec (for most images it was 0.4-0.5 arcsec). For none of the ten Cepheids in Table 2 there is evidence for a photometrically significant companion star in the infrared images. This is also borne out in the PL diagrams shown in Figs. 3 and 4, where no obvious outlier is observed. A significantly blended Cepheid should be too bright for its period and stand out from the mean PL relation, and this is clearly not observed in the case of our sample. The only candidate, from its location in the K-band PL plane, would be the variable cep016 which is ∼0.25 mag brighter than the ridge line at the corresponding period, but such an offset is compatible with the combined effect of the intrinsic width of the Cepheid instability strip, which is about ±0.2 mag in the K band, and the standard deviation of the mean K magnitude of this star of ±0.07 mag (see Table 2). Also, this star lies almost exactly on the ridge line in the J-band period-luminosity plane, arguing against significant blending. As a general guide for the effect of blending on Cepheid distances we can use our previous HST-based study on NGC 300 which is also a member galaxy of the Sculptor Group. Comparison of HST ACS photometry to ground-based photometry allowed us to set an upper limit of ±0.04 mag for the effect blending of the Cepheids in NGC 300 might have on the derived Cepheid distance modulus (Bresolin et al. 2005). NGC 300, at about 1.9 Mpc (Gieren et al. 2005), is about 1.5 Mpc nearer than NGC 247 however, so we might expect a slightly larger effect of blending for NGC 247. From the arguments given, we assume that

– 10 –

0.06 mag, or 3% is a reasonable upper limit for the possible remaining effect of unresolved stars in the Cepheid photometry on the distance result. The effect acts to make Cepheids too bright and therefore tends to decrease the derived distance.

Another potential cause of concern is the possible non-universality of the Cepheid PL relation. Sandage and Tammann (2008) have recently put forward arguments to demonstrate that both slope and zero point of the PL relation (in any given passband) depend on the slope of the Cepheid instability strip on the HR diagram, which in turn is metallicity-dependent. They conclude that as a consequence the coefficients of the PL relation must depend, to some degree, on the metallicity of the Cepheids. In their paper, they show a table which reports empirically determined PL relation slopes in different galaxies which indeed seem to suggest that the Cepheid PL relation is steepest for the most metal-rich galaxies, supporting their claim from theoretical arguments. However, the uncertainties on the empirical slopes of the PL relations in the different galaxies they compare are not given; from our own work in the Araucaria Project, which has generally provided the best Cepheid samples in the different target galaxies of the project, we know that the uncertainties attached to the least-squares fits to the period-magnitude diagrams are generally large enough to hide any systematic change of slope with metallicity, should it exist. So the empirical evidence for a systematic change of the slope of the PL relation (in any band) with metallicity is very weak, at the present time. On the other hand, the OGLE project has found, from many hundreds of extremely well-observed Cepheids in both Magellanic Clouds, that the slopes of the Cepheid PL relations in V and I, respectively in both Clouds agree very well, within extremely small uncertainties (Udalski et al. 1998; Udalski 2000), in spite of the metallicity difference of ∼0.4 dex between its Cepheid populations (Luck et al. 1998), arguing against a dependence of the PL relation slope on metallicity. Also, very recent and improved work using the infrared surface brightness technique (Fouqué and Gieren 1997; Gieren et al. 1997) to measure direct distances to Cepheids in the Milky Way galaxy and the LMC has led to a re-calibration of the method which has produced PL relations in the LMC and Milky Way, in passbands from B through K, whose respective slopes agree within a fraction of their respective standard deviations (Gieren et al. 2005c; Fouqué et al. 2007). It seems to us that the accumulated empirical evidence favors a universal, metallicity-independent slope over the scenario put forward by Sandage and Tammann, at the present time, but further work on this crucial question is obviously required. Until truly convincing empirical evidence becomes available demonstrating a significant metallicity effect on the slope of the PL relation, we will assume the constancy of the slope in all photometric bands, in agreement with the results we have obtained so far in the Araucaria Project.

Regarding the effect metallicity has on the zero point of the Cepheid PL relation, a

– 11 –

recent study of Romaniello et al. (2008) indicates that there is indeed a small effect in optical bands, but only a marginal effect in the near-infrared K band. In V, metal-rich Cepheids appear to be slightly intrinsically fainter than their more metal-poor counterparts. The smallness and sign of the metallicity effect on the Cepheid PL relation zero points found by Romaniello et al. is in agreement with most other published work (discussed in that paper). While we will re-discuss the metallicity effect from our own data on the Araucaria project galaxies in the near future, our preliminary findings on the metallicity dependence of the PL relation are consistent with a very small, and possible vanishing effect on the zero points in optical and near-IR bands. Any systematic uncertainty on the current distance modulus of NGC 247 from the metallicity difference between its Cepheids and those of the LMC which provide the fiducial PL relation is expected to be very small, probably less than 2%. This statement rests on both the smallness of the metallicity effect as found by Romaniello et al. (2008) and other authors, and the expectation that the mean metallicity of the young stellar population in NGC 247 is quite close to that of the LMC. This second statement is in turn based on the similarity of NGC 247 to NGC 300, whose young stars (and H II regions) at mean galactocentric radii have been found to possess LMC metallicity (Kudritzki et al. 2008; Bresolin et al. 2009).

As in the previous papers in this series, the distance of our target galaxy in this paper, NGC 247, is tied to an assumed distance modulus of 18.50 mag for the LMC. In spite of the intense work of many groups over the years, this value may still be uncertain by as much as 10% (e.g. Benedict et al. 2002; Schaefer 2008). Very recently, the discovery of a number of late-type eclipsing binary systems in the LMC for which the distances can be measured very accurately has opened a new possibility to measure the distance to the LMC with an unprecedented accuracy (Pietrzynski et al. 2009). This new route might finally allow to measure the LMC distance with an accuracy close to 1%.

¿From the discussion in this section we conclude that the total systematic uncertainty on the new infrared-based Cepheid distance reported in this paper is in the order of ∼4%. In estimating this number, we assume that future work will confirm the universality of the slope of the Cepheid PL relation. The 4% systematic error of our current distance determination does not include the current uncertainty of the adopted LMC distance.

Among the various attempts which were made in the past to determine the distance to NGC 247 (which have been listed and discussed in Paper I), the present determination is clearly the most accurate one. Probably the most accurate previous measurement with methods independent of Cepheids was made by Karachentsev et al. (2006) with the TRGB method; their distance result of 27.87 ± 0.21 mag agrees with our infrared Cepheid distance within the combined 1 σ error bars of both measurements. The fact that it agrees even

– 12 –

better with our previous Cepheid distance to NGC 247 from VI data is certainly fortituous and may have its explanation in the systematic uncertainties affecting the TRGB method.

The distance of NGC 247 determined in this paper confirms that this galaxy is quite significantly more distant than the other two member galaxies of the Sculptor Group we have studied before, NGC 55 (Gieren et al. 2008a; Pietrzynski et al. 2006b) and NGC 300 (Gieren et al. 2005b). This confirms the previous conclusion of Jerjen et al. (1998) that the Sculptor Group exhibits a filament-like structure with a large depth extension in the line of sight.

5. Summary and conclusions

We have carried out the first distance determination for the spiral galaxy NGC 247 located in the nearby Sculptor Group using deep near-infrared images, and our multiwavelength technique presented and applied in the earlier studies in this series. The distance we determine has a random uncertainty less than 2%, and a systematic uncertainty in the order of ±4%. The systematic uncertainty is likely to be dominated by the effect of unresolved stars on the Cepheid photometry while the effect of metallicity on the Cepheid PL relation, and particularly the effect of interstellar absorption are only smaller contributors to the total systematic uncertainty of our result. The full assessment of the reddening suffered by the NGC 247 Cepheids due the use of near-infrared photometry has led to a decrease of the distance modulus reported in Paper I, and independently by Madore et al. (2009), by 7%. As in all our previous studies in the Araucaria Project, the distance to NGC 247 is tied to an assumed distance modulus of 18.50 for the LMC.

We find a mean reddening of E(B-V)=0.18 mag for the Cepheids in NGC 247. Since the foreground reddening to this galaxy is only ∼0.02 mag (Schlegel et al. 1998), 0.16 mag are produced inside NGC 247, which is higher than in any other galaxy we have studied so far in the Araucaria Project. This shows that it is mandatory to use deep infrared photometry to handle the absorption problems when using Cepheids for distance determinations to relatively massive spiral galaxies.

The present study adds another spiral galaxy to our sample of galaxies in the Araucaria Project for which an accurate Cepheid distance, based on deep infrared photometry, is now available for comparative analyses with the distances obtained from other stellar techniques, particularly the Tip of the Red Giant Branch method (e.g. Rizzi et al. 2006), and the FGLR method (Kudritzki et al. 2003, 2008). Such comparative analyses will improve the determination of the environmental dependences of the different techniques of distance

– 13 –

measurement.

We find that NGC 247 is about 1.5 Mpc more distant than the Sculptor Group spirals NGC 300 and NGC 55, and therefore not physically associated to neither of these two spirals.

WG, GP and DM gratefully acknowledge financial support for this work from the Chilean Center for Astrophysics FONDAP 15010003, and from the BASAL Centro de Astrofisica y Tecnologias Afines (CATA) PFB-06/2007. Support from the Polish grant N203 002 31/046 and the FOCUS subsidy of the Fundation for Polish Science (FNP) is also acknowledged. I.S. was supported by the Foundation for Polish Science through the Homing Programme. It is a great pleasure to thank the support astronomers at ESO-Paranal for their expert help in the observations, and the ESO OPC for the generous amounts of observing time at the VLT allocated to our Large Programme.

REFERENCES

Benedict, G.F., McArthur, B.E., Fredrick, L.W., et al., 2002, AJ, 123, 473 Bresolin, F., Pietrzyński, G., Gieren, W., and Kudritzki, R.-P., 2005, ApJ, 634, 1020 Bresolin, F., Gieren, W., Kudritzki, R.P., Pietrzyński, G., Urbaneja, M.A., and Carraro, G., 2009, ApJ, submitted Fouqué, P., and Gieren, W., 1997, A&A, 320, 799 Fouqué, P., Arriagada, P., Storm, J., Barnes, T.G., Nardetto, N., Mérand, A., Kervella, P., Gieren, W., Bersier, D., Benedict, G.F., and McArthur, B.E., 2007, A&A, 476, 73 Freedman, W.L., et al., 2001, ApJ, 553, 47 García-Varela, A., Pietrzyński, G., Gieren, W., Udalski, A., Soszyński, I., Walker, A., Bresolin, F., Kudritzki, R.P., Szewczyk, O., Szymanski, M., Kubiak, M., and Wyrzykowski, L., 2008, AJ, 136, 1770 (Paper I) Gieren, W., Fouqué, P., and Gómez, M., 1997, ApJ, 488, 74 Gieren, W., Pietrzyński, G., Bresolin, F., et al., 2005a, The ESO Messenger, 121, 23 Gieren, W., Storm, J., Barnes III, T.G., Fouqué, P., Pietrzyński, G., and Kienzle, F., 2005c, ApJ, 627, 224 Gieren, W., Pietrzyński, G., Soszyński, I., Bresolin, F., Kudritzki, R.-P., Minniti, D., and Storm, J., 2005b, ApJ, 628, 695

– 14 –

Gieren, W., Pietrzyński, G., Nalewajko, K., Soszyński, I., Bresolin, F., Kudritzki, R.P., Minniti, D., and Romanowsky, A., ApJ, 647, 1056 Gieren, W., Pietrzyński, G., Soszyński, I., Bresolin, F., Kudritzki, R.P., Storm, J., and Minniti, D., 2008a, ApJ, 672, 266 Gieren, W., Pietrzyński, G., Szewczyk, O., Soszyński, I., Bresolin, I., Kudritzki, R.P., Urbaneja, M.A., Storm, J., and Minniti, D., 2008b, ApJ, 683, 611 Hawarden, T.G., Leggett, S.K., Letawsky, M.B., et al., 2001, MNRAS, 325, 563 Jerjen, H., Freeman, K.C., and Binggeli, B., 1998, AJ, 116, 2873 Karachentsev, I., et al., 2006, AJ, 131, 1361 Kudritzki, R.P., Bresolin, F., and Przybilla, N., 2003, ApJ, 582, L83 Kudritzki, R.P., Urbaneja, M.A., Bresolin, F., Przybilla, N., Gieren, W., and Pietrzyński, G., 2008, ApJ, 681, 269 Luck, E., Moffett, T.J., Barnes, T.G., and Gieren, W., 1998, AJ, 115, 605 Madore, B.F., Freedman, W.L., Catanzarite, J., and Navarrete, M., 2009, ApJ, in press (arXiv 0901.3097) Persson, S.E., Madore, B.F., Krzeminski, W., Freedman, W.L., Roth, M, and Murphy, D.C., 2004, AJ, 128, 2239 Pietrzyński, G., and Gieren, W., 2002, AJ, 124, 2633 Pietrzyński, G., Gieren, W., and Udalski, A., 2002, PASP, 114, 298 Pietrzyński, G., Gieren, W., Fouqué, P., and Pont, F., 2002, AJ, 123, 789 Pietrzyński, G., Gieren, W., and Udalski, A., 2003, AJ, 125, 2494 Pietrzyński, G., Gieren, W., Soszyński, I., Bresolin, F., Kudritzki, R.-P., Dall’Ora, M., Storm, J., and Bono, G., 2006a, ApJ, 642, 216 Pietrzyński, G., Gieren, W., Soszyński, I., Udalski, A., Bresolin, F., Kudritzki, R.P., Mennickent, R., Walker, A., Garcia-Varela, A., and Kubiak, M., 2006b, AJ, 132, 2556 Pietrzyński, G., Gieren, W., Szewczyk, O., Walker, A., Rizzi, L., Bresolin, F., Kudritzki, R.P., Nalewajko, K., Stoem, J., Dall’Ora Massimo, Ivanov, V., 2008, AJ, 135, 1993 Pietrzyński, G., Thompson, I., Graczyk, D., Gieren, W., Udalski, A., Szewczyk, O., Minniti, D., Kolaczkowski, Z., Bresolin, F., and Kudritzki, R.P., 2009, ApJ, in press (arXiv 0903.0855) Rizzi, L., Bresolin, F., Kudritzki, R.P., Gieren, W., and Pietrzyński, G., 2006, ApJ, 638, 766

– 15 –

Romaniello, M., Primas, F., Mottini, M., Pedicelli, S., Lemasle, B., Bono, G., Francois, P., Groenewegen, M.A.T., and Laney, C.D., 2008, A&A, 488, 731 Sandage, A., and Tammann, G.A., 2008, ApJ, 686, 779 Schaefer, B.E., 2008, AJ, 135, 112 Schlegel, D.J., Finkbeiner, D.P., and Davis, M., 1998, ApJ, 500, 525 Soszyński, I., Gieren, W., and Pietrzyński, G., 2005, PASP, 117, 823 Soszyński, I., Gieren, W., Pietrzyński, G., et al., 2006, ApJ, 648, 375 Szewczyk, O., Pietrzyński, G., Gieren, W., Storm, J., Walker, A., Rizzi, L., Kinemuchi, K., Bresolin, F., Kudritzki, R.P., and Dall’Ora, M., 2008, AJ, 136, 272 Udalski, A., 2000, Acta Astron., 50, 279 Udalski, A., Szymański, M., Kubiak, M., Pietrzyński, G., Woźniak, P., and Żebruń, K., 1998, Acta Astron., 48, 147 Urbaneja, M.A., Kudritzki, R.P., Bresolin, F., Przybilla, N., Gieren, W., and Pietrzyński, G., 2008, ApJ, 684, 118

This preprint was prepared with the AAS L^ATEX macros v4.0.

– 16 –

Fig. 1.— The location of the four observed VLT ISAAC fields in NGC 247 on the DSS blue plate. These fields contain 10 Cepheids previously discovered in our optical survey for Cepheid variables in this galaxy (Paper I). Each field except field No.3 was observed twice on different nights to obtain the Cepheid infrared magnitudes at two different pulsation phases.

– 17 –

Fig. 2.— The near-infrared color-magnitude diagram for NGC 247 obtained from our VLT- ISAAC data. Also plotted are the positions of the Cepheids in our sample (filled circles). They delineate the location of the Cepheid instability strip in its expected position. There is no evidence for any peculiarity of the Cepheids from their locations in this diagram.

– 18 –

Fig. 3.— The Cepheid period-luminosity relation for NGC 247 in the J band, as obtained from the mean magnitudes in Table 2. The dotted line is the best fit to the data, with the slope fixed to the LMC value of Persson et al. The mean magnitudes were determined using the technique of Soszynski et al.

– 19 –

Fig. 4.— Same as Fig. 3, for the K band.

– 20 –

Fig. 5.— Apparent distance moduli to NGC 247 derived in the VIJK photometric bands, plotted against the ratio of total to selective extinction as adopted from the Schlegel et al. reddening law. The intersection and slope of the best-fitting line yield the true distance modulus and reddening, respectively. The data in this diagram suggest that the Galactic reddening law is a very good approximation for NGC 247 as well.

– 21 –

Table 1. Journal of the Individual J and K band Observations of NGC 247 Cepheids

ID J HJD J σ_J K HJD K σ_K

cep006 3592.86819 21.216 0.068 3592.78328 20.753 0.098 cep006 3661.62511 20.623 0.090 3661.60091 20.140 0.054 cep008 3625.72588 20.771 0.054 3625.67282 20.288 0.075 cep009 3657.69064 20.684 0.052 3657.60342 20.189 0.067 cep012 3592.86819 20.433 0.033 3592.78328 19.969 0.044 cep012 3661.62511 20.626 0.061 3661.60091 20.058 0.055 cep015 3607.73856 20.846 0.036 3607.77029 20.454 0.058 cep015 3693.69953 20.532 0.113 3693.65978 20.264 0.071 cep016 3625.72588 20.671 0.048 3625.67282 19.839 0.062 cep018 3625.72588 20.137 0.031 3625.67282 19.420 0.033 cep019 3592.86819 20.072 0.038 3592.78328 19.361 0.062 cep019 3661.62511 20.011 0.058 3661.60091 19.400 0.039 cep021 3607.73856 19.861 0.035 3607.77029 19.164 0.040 cep021 3693.69953 19.656 0.067 3693.65978 19.323 0.035 cep023 3592.86819 18.873 0.020 3592.78328 18.356 0.034 cep023 3661.62511 18.969 0.023 3661.60091 18.261 0.028

– 22 –

Table 2. Intensity mean J and K magnitudes for 10 Cepheid variables in NGC 247

ID log P < J > σ_J < K > σ_K days mag mag mag mag

cep006 29.585 20.908 0.064 20.326 0.063 cep008 30.978 20.887 0.062 20.394 0.081 cep009 32.114 20.781 0.060 20.314 0.073 cep012 35.809 20.662 0.046 20.157 0.046 cep015 41.393 20.569 0.066 20.160 0.055 cep016 44.481 20.413 0.057 19.605 0.069 cep018 63.505 20.194 0.043 19.487 0.045 cep019 64.889 20.091 0.046 19.428 0.047 cep021 69.969 19.754 0.048 19.213 0.040 cep023 131.259 18.914 0.034 18.297 0.037

Table 3. Reddened and Absorption-Corrected Distance Moduli for NGC 247 in Optical and Near-Infrared Bands V I J K E(B − V ) m − M 28.200 28.040 27.799 27.702 – R_λ 3.24 1.96 0.902 0.367 – (m − M)_0 27.625 27.693 27.639 27.637 0.177