arXiv:0807.3585v3 [quant-ph] 6 Nov 2008

Dynamical Backaction of Microwave Fields on a Nanomechanical Oscillator

J. D. Teufel,^{1, ∗} J. W. Harlow,^{1, 2} C. A. Regal,^3 and K. W. Lehnert^{1, 2} 1JILA, National Institute of Standards and Technology and the University of Colorado, Boulder, CO 80309, USA 2Department of Physics, University of Colorado, Boulder, CO 80309, USA 3Norman Bridge Laboratory of Physics 12-33, California Institute of Technology, Pasadena, California 91125, USA

We measure the response and thermal motion of a high-Q nanomechanical oscillator coupled to a superconducting microwave cavity in the resolved-sideband regime where the oscillator’s resonance frequency exceeds the cavity’s linewidth. The coupling between microwave field and mechanical motion is strong enough for radiation pressure to overwhelm the intrinsic mechanical damping. This radiation pressure damping cools the fundamental mechanical mode by a factor of 5 below the thermal equilibrium temperature in a dilution refrigerator to a phonon occupancy of 140 quanta.

PACS numbers: 85.85.+j, 42.50.Wk, 85.25.-j, 84.40.Dc, 05.40.Jc

Recent advances in coupling mechanical oscillators to electromagnetic resonances have led to accelerated progress in both measuring and cooling mechanical motion [1, 2, 3, 4, 5, 6, 7]. In cavity optomechanical systems, the motion of a mechanically compliant object tunes the resonance frequency of an optical cavity, while the intracavity light exerts a backaction force on the element [7, 8]. With these systems, observing quantum behavior of mechanical objects seems feasible. To reach this quantum regime, one must be able to minimize the random thermal motion of the harmonic oscillator so that the zero-point motion becomes dominant. Furthermore, the oscillator must also be compatible with a measurement technique that is sensitive enough to resolve this residual motion. In the field of cavity optomechanics, the strong interaction between the photons in an electromagnetic cavity and the phonons in a mechanical oscillator provides both sensitive measurement and the potential for ground-state cooling.

Despite the large optomechanical coupling achieved with high-finesse Fabry-Perot cavities, mechanical ground-state cooling remains elusive. For optical backaction to cool a mechanical oscillator to its ground state, the cavity optomechanical system must reach the resolved-sideband limit where the oscillator’s resonance frequency ω_m exceeds the cavity linewidth γ. (This condition is analogous to the requirements for laser sideband cooling first demonstrated with trapped ions several decades ago [9].) In cavity optomechanics, only the highest-finesse cavities approach this limit. It is only in recent experiments with a microtoroid simultaneously serving as both the mechanical and optical resonator that ω_m > γ is achieved [10]. While reaching the ground state of the oscillator is aided by precooling in a cryostat, this is technically challenging in optical systems [11].

In this Letter, we demonstrate a microwave optomechanical system that is well into the resolved-sideband limit (ω_m = 6.6 × γ) and is compatible with precooling in a dilution refrigerator. Within a superconducting, microwave, transmission-line resonator, we embed a nanomechanical oscillator in the form of a freely sus-

FIG. 1: (color online). (a) Sketch of a nanomechanical beam embedded in a microwave cavity with a measurement schematic. The solid (blue) region represents the patterned aluminum film. The cavity is excited by a microwave signal propagating in a nearby transmission line. The motion of the oscillator is encoded in the amplitude and phase of the transmitted signal. We recover the motion of the oscillator by amplifying and mixing this signal with a reference. (b) Power spectral density of cavity frequency fluctuations (f = ωc/2π). Data are shown for two different cryostat temperatures of 50 mK (lower) and 240 mK (upper) with a Lorentzian fit (solid lines) to each trace. (c) The mean-square fluctuations in the cavity’s resonance frequency due to the thermal motion of the oscillator as a function of cryostat temperature. The linear fit (solid line) yields g = 2π × 6.4 kHz/nm.

pended, doubly clamped beam [Fig. 1(a)]. We show that the frequency and power of the microwave signal applied to the cavity strongly affect the mechanical properties of the oscillator. These effects are in excellent agreement with the theoretical predictions for the dynamical backaction in the resolved-side band regime. We also measure the thermal motion of the beam and show that the small number of thermal quanta (m̄ = 700) of the mechanical mode in equilibrium with a 50 mK dilution refrigerator can be further cooled using dynamical backaction to m̄ = 140. These measurements demonstrate that the mechanical damping can be dominated by the radiation pressure effects, indicating that this system is an excellent candidate for probing the quantum behavior of a tangible harmonic oscillator.

Unlike traditional optomechanical systems where the mechanically compliant object must be large enough to focus a laser on its surface, microwave cavities can efficiently couple to mechanical oscillators whose crosssectional area is limited only by the lithographic techniques used to fabricate them. Lighter oscillators respond to the smaller radiation pressure forces imparted by microwave photons because they have larger zero-point motion, x_{zp} = √ h̄/(2mω_m), where m is the effective mass of the oscillator and x is the displacement at the center of the beam. Together, the narrow linewidth of a superconducting microwave cavity and the large mechanical resonance frequency of a light oscillator easily achieve the resolved-sideband limit. Finally, the resulting microwave, optomechanical system is naturally compatible with low temperature (T < 1 K) operation [6, 12]. The low thermal occupancy of the mechanical mode greatly reduces the radiation pressure effects necessary to cool to the ground state.

Recent theory [13, 14] predicts that radiation pressure forces at frequencies near ω_m alter the mechanical oscillator’s response function. When the cavity is excited with a tone at frequency ω_e, this dynamical backaction adds a term Γ to the oscillator’s damping rate and Ω to its resonance frequency, where

Γ = B [ γ γ^2 + 4 (Δ + ω_m)^2 − γ γ^2 + 4 (Δ − ω_m)^2 ] , (1)

Ω = B [ Δ + ω_m γ^2 + 4 (Δ + ω_m)^2 + Δ − ω_m γ^2 + 4 (Δ − ω_m)^2 ] , (2)

and Δ = ω_e − ω_c is the detuning between the frequency of excitation and the cavity’s resonance. The prefactor B = 4n̄g^2x^2_{zp} controls the strength of the optomechanical interaction. Here n̄ is the average number of photons in the cavity and g is the optomechanical coupling (dω_c/dx). When the microwave signal is applied above the cavity resonance (Δ > 0), Γ < 0 and the oscillator’s motion is amplified. When the total damping, the sum of the intrinsic dissipation γ_{m0} and the radiation damping, becomes negative (γ_m = γ_{m0} + Γ < 0), the mechanical motion undergoes regenerative oscillations [15]. By detuning below the cavity resonance, the increased damping is accompanied by cooling of the mechanical motion. In the presence of radiation damping, the oscillator is coupled to two baths: one characterized by the physical temperature of its surroundings T_0, and the other by an effective nonequilibrium temperature of the radiation pressure force T_p. The final temperature is given by the weighted average of these two quantities: T_m = (γ_{m0}T_0 + ΓT_p)/γ_m [13, 14].

FIG. 2: (color online). The mechanical damping and resonance frequency shift as functions of detuning. As the detuning is changed, the incident microwave power is adjusted to keep the circulating power constant. The solid lines are a coupled fit to Eqs. (1) and (2) where the only free parameter is the circulating microwave power. This power agrees within the 3 dB uncertainty with which the attenuation within the cryostat is known. Data is missing near Δ = ωm where the beam regeneratively oscillated, as expected for γm < 0.

In our device, the cavity is a quarter-wave coplanar waveguide (CPW) resonator [16] with ω_c = 2π × 5.22 GHz, and γ = 2π × 230 kHz. The mechanical oscillator is a doubly clamped beam with dimensions of 100 × 0.13 × 0.12 μm^3 and has an effective mass of 6.2 × 10^{−15} kg. The beam is freely suspended within a voltage antinode of the cavity, and its in-plane motion capacitively loads the cavity and modulates the electrical length. These devices are fabricated by patterning a resist mask with a combination of optical and electron-beam lithography, and then depositing both the microwave cavities and mechanical oscillators with a single evaporation of aluminum [Fig. 1(a)]. The device is annealed at 340^∘C for 30 minutes, and then the beam is suspended using an SF_6 reactive-ion etch to remove the silicon substrate in a small region around the nanomechanical beam. The annealing step increases the tensile stress in the aluminum film which increases both ω_m and the quality factor (Q_m = ω_m/γ_m) by 50 times what is measured in unstressed devices [6, 12]. At low temperatures, ω_m = 2π × 1.525 MHz and Q_m > 300, 000. All measurements of the device are made in a dilution refrigerator using homodyne detection shown schematically in Fig. 1(a) and discussed in previous work [6].

We infer the displacement of the nanomechanical beam by monitoring the amplitude and phase fluctuations of the microwave field emerging from the cavity. We can also apply an electrostatic force to the beam by varying the potential of a nearby electrode [6]. To characterize the optomechanical coupling, we use the thermal mechanical motion as a calibration [Fig. 1(b) and (c)]. Even in the absence of any applied force, the measurement easily resolves a peak in the power spectral density of the demodulated microwave signal at the mechanical resonance frequency. This peak is due to the thermal motion of the beam; therefore, the area of the peak should be proportional to temperature in accordance with the equipartition theorem. We indeed find that above 50 mK the peak area follows a linear relationship with the cryostat temperature, from which we find an optomechanical coupling of g = 2π × 6.4 kHz/nm. In the resolved-sideband limit, the signal-to-noise ratio of the measurement is best when the microwave excitation is detuned from the cavity resonance by the mechanical resonance frequency. As this is also the point of strongest dynamical backaction, we perform this calibration with Δ = −ω_m, but at a very low circulating power of P_c = h̄ω^2_en̄ = 50 nW. At this low power, there is no discernable difference in the mechanical properties between detuning to either side of the cavity resonance.

As the microwave power is increased, the effects of the radiation as given by Eqs. (1) and (2) become apparent. Figure 2 shows the mechanical linewidth and resonance frequency as functions of detuning while holding P_c constant. At each detuning, we measure the mechanical response to an applied force in order to extract ω_m and γ_m. Note that in this resolved-sideband limit, the change in the beam’s mechanical properties with detuning around Δ = ±ω_m reproduces the complex response of the cavity. The agreement with Eqs. (1) and (2) demonstrates that it is the finite response time of the cavity that is responsible for the damping. The independently determined values of ω_m, γ, and g accurately account for the location, width, and height of the features in Fig. 2. For this intermediate circulating power of 900 nW, the magnitude of the radiation damping is slightly greater than the intrinsic damping (Γ >∼ γ_{m0}). The mechanical linewidth is roughly doubled for Δ = −ω_m and becomes negative near Δ = +ω_m. In this region of negative damping, we observe regenerative oscillations of the beam.

We next increase the microwave power in order to understand how large these radiation effects can be. There is a practical limit on P_c in our cavity set by the strength of the superconductivity in the aluminum that defines the cavity. Beyond P_c ≈ 1 μW, the cavity resonance becomes nonlinear and eventually bistable. This effect does not preclude mechanical measurements; however, in this regime, changing the microwave power changes the cavity lineshape and shifts its resonance frequency. We measure the mechanical response and find γ_m and ω_m at the largest microwave powers (Fig. 3). To avoid regenerative mechanical oscillations, we only measure in the region Δ < 0. Because the detuning is referenced to the low-power resonance frequency of the cavity, each higher power curve has an optimum detuning (maximal γ_m) that is lower in frequency. This is a direct measure of the nonlinear shift in the cavity’s resonance frequency. Unlike the data in Fig. 2, these curves are taken with

FIG. 3: (color online). The mechanical damping and resonance frequency shift as functions of detuning for microwave powers that drive the cavity nonlinear. Each curve corresponds to a different incident microwave power, and the detuning is relative to the low-power resonance frequency of the cavity. As the incident power is increased from 16 nW (violet, right) to 100 nW (red, left) in 1 dB steps, the absolute frequency at which maximum mechanical damping occurs follows the nonlinear cavity resonance to lower frequency.

a constant incident power P_i. For our geometry in the overcoupled regime, P_i = h̄ω_en̄(γ^2 + 4Δ^2)/γ. These data demonstrate a microwave optomechanical system operating both in the resolved-sideband and the radiationdominated limit (Γ ≫ γ_{m0}).

Since the unique benefit of operating in the resolvedsideband limit is the potential to cool the mechanical mode of interest to the ground state [13, 14, 17], we now examine the oscillator’s temperature as a function of microwave power. To do this, the detuning is adjusted to the optimal cooling point, as determined from the data in Fig. 3. Because we are using the microwave signal both to cool the beam and to measure the displacement, it is important that we have a valid calibration. We apply a constant electrostatic force to the beam whose magnitude we know from our low-power thermal calibration (Fig. 1). In this way, the measured power spectral density can be converted to displacement units, as shown in Fig. 4(a). Because of the stronger optomechanical coupling and higher mechanical resonance frequency, the displacement sensitivity is not limited by the cavity frequency noise as seen in previous experiments [6]; the absolute sensitivity improves with increasing power even at the highest microwave power. Furthermore, as the microwave power is increased, the thermal peak becomes wider (lower Q_m) and smaller (less area), indicating that the additional damping is accompanied by cooling. Because ω_m = 6.6 × γ, the effective temperature of the photon bath is negligible (T_p ≈ 10 μK) compared to that of the cryogenic environment [13, 14]. Thus, the temperature of the mechanical mode in the presence of radiation effects should be determined from the increase in damp-

FIG. 4: (color online) (a) Thermal noise of the mechanical motion. Each noise spectrum (dots) is taken at a new microwave power such that the microwave carrier is optimally detuned from the cavity resonance for maximum mechanical damping and cooling. The solid lines show Lorentzian fits, which are used to determine γm and Tm. The data are not offset; as the circulating power is increased from 46 pW (upper, red) to 7.3 μW (lower, violet), the absolute measurement imprecision improves. (b) The total damping (squares) and a dashed line indicating γm ∝ Pc as predicted by Eq. (1) when Γ ≫ γm0. (c) The temperature of the mechanical mode, as determined from the area of the noise spectra, shows cooling from 50 mK to 10 mK.

ing, T_m ≈ T_0(γ_{m0}/γ_m). Figure 4(b) shows that at the highest powers the damping is increased by a factor of 30 and the temperature is reduced by a factor of 5. We suspect this discrepancy arises from the fact that large microwave power may heat the local environment [6]. Because γ_{m0} increases with temperature, parasitic heating would reduce our cooling in two ways, both by warming the bath to which the beam is coupled and by coupling more strongly to that bath. Nevertheless, Fig. 4(b) shows that at the highest powers, the damping becomes linear in power as expected from radiation pressure effects [Eq. (1)], overwhelming the weakly power dependent intrinsic damping γ_{m0} and cooling the beam to 10 mK. The natural metric to quantify this cooling is how many thermal quanta remain in the mechanical oscillator. For this device, cooling to 10 mK corresponds to a final phonon occupation of m̄ = 140 ± 7. This cooling is currently limited by the microwave power that can be applied to the cavity, not by a fundamental limitation of the dynamical backaction. For example, at the point of maximum cooling, the mechanical oscillator still has a quality factor of approximately 10,000.

In future devices, several improvements should allow us to exploit the full-cooling potential of the resolvedsideband regime. Fabricating the cavity out of a higher transition temperature superconducting metal, such as niobium, will greatly increase the circulating power at which the resonance becomes nonlinear. At higher power, the cavity frequency noise creates a larger radiationpressure force on the beam, but with a modest increase in the coupling strength, this random force will not prevent m̄ < 1. Once cooling at or near the ground state becomes technically feasible, an equally important component is a measurement that is sensitive enough to resolve the residual quantum motion. To this end, we will integrate this measurement technique with a quantumlimited microwave amplifier that will allow displacement measurements with improved sensitivity [18].

In conclusion, we have shown that by coupling a superconducting microwave resonator to the motion of a nanomechanical oscillator, one can reach the resolvedsideband limit. The coupling is strong enough that the dynamical backaction of the microwave photons can become the dominant source of mechanical dissipation, a prerequisite for cooling to the mechanical ground state. This damping cools the fundamental mechanical mode of the oscillator fivefold to a thermal occupation of 140 phonons. These measurements indicate that this optomechanical system is a promising candidate for realizing ground-state cooling of a mechanical oscillator.

The authors acknowledge funding from the National Institute of Standards and Technology (NIST) and from the National Science Foundation; C.A.R. acknowledges support from the Millikan Postdoctoral Fellowship. We thank M. A. Castellanos-Beltran and N. E. Flowers- Jacobs for discussions and technical assistance.

∗ Electronic address: john.teufel@colorado.edu [1] S. Gigan et al., Nature 444, 67 (2006). [2] O. Arcizet et al., Nature 444, 71 (2006). [3] A. Naik et al., Nature 443, 193 (2006).

[4] K. R. Brown et al., Phys. Rev. Lett. 99, 137205 (2007). [5] J. D. Thompson et al., Nature 452, 72 (2008). [6] C. A. Regal, J. D. Teufel, and K. W. Lehnert, Nature Phys. 4, 555 (2008).

[7] T. J. Kippenberg and K. J. Vahala, Science 321, 1172 (2008) and references therein.

[8] V. B. Braginsky, A. B. Manukin, and M. Y. Tikhonov, Sov. Phys. JETP 31, 829 (1970).

[9] F. Diedrich et al., Phys. Rev. Lett. 62, 403 (1989). [10] A. Schliesser et al., Nature Phys. 4, 415 (2008). [11] S. Gröblacher et al., Europhys. Lett. 81, 54003 (2008). [12] J. D. Teufel, C. A. Regal, and K. W. Lehnert, New J.

Phys. 10 095002 (2008).

[13] F. Marquardt et al., Phys. Rev. Lett. 99, 093902 (2007). [14] I. Wilson-Rae et al., Phys. Rev. Lett. 99, 093901 (2007). [15] V. B. Braginsky, S. E. Strigin and S. P. Vyatchanin, Phys.

Lett. A 287, 331 (2001).

[16] P. K. Day et al., Nature 425, 817 (2003). [17] J.M. Dobrindt, I. Wilson-Rae, and T.J. Kippenberg, arXiv:0805.2528v1.

[18] M. A. Castellanos-Beltran et al., Nature Phys. (to be published) doi:10.1038/nphys1090.