arXiv:0803.1771v2 [physics.optics] 24 Jun 2008

Full Stabilization of a Microresonator based Optical Frequency Comb

P. Del’Haye, O. Arcizet, A. Schliesser, R. Holzwarth, T. J. Kippenberg^∗ Max-Planck-Institut für Quantenoptik, 85748 Garching, Germany

We demonstrate control and stabilization of an optical frequency comb generated by four-wave mixing in a monolithic microresonator with a mode spacing in the microwave regime (86 GHz). The comb parameters (mode spacing and offset frequency) are controlled via the power and the frequency of the pump laser, which constitutes one of the comb modes. Furthermore, generation of a microwave beat note at the comb’s mode spacing frequency is presented, enabling direct stabilization to a microwave frequency standard.

PACS numbers: 42.62.Eh, 42.65.Ky, 42.65.Yj Keywords: Frequency comb, Stabilization, Locking, Four-wave mixing, Kerr nonlinearity, microcavity, microresonator

Introduction.—Optical frequency combs [1, 2] have become a powerful tool for high precision spectroscopy over the past decade and are moreover used for various applications such as broadband gas sensing [3], molecular fingerprinting [4], optical clocks [5] and attosecond physics [6]. Frequency comb generation naturally occurs in mode-locked lasers whose emission spectrum constitutes an “optical frequency ruler” and consists of phase coherent modes with frequencies f_m = f_{CEO} + m · f_{rep} (where m is the number of the comb mode). Consequently, stabilization of a frequency comb requires access to two parameters: the spacing of the modes, which is given by the rate f_{rep} at which pulses are emitted, and the offset frequency, given by the carrier envelope offset frequency f_{CEO}, which can be measured and stabilized using the powerful technique of self-referencing (by employing for instance an f − 2f interferometer [7, 8]). Indeed, these techniques have been critical to the success of mode locked lasers as sources of optical frequency combs.

Recently, a monolithic frequency comb generator has been demonstrated for the first time [9]. This approach is based on continuously pumped fused silica microresonators on a chip, in which frequency combs are generated via parametric frequency conversion through fourwave mixing [10], mediated by the Kerr nonlinearity [11, 12, 13, 14, 15]. In this energy conserving process, two pump photons are converted into a symmetric pair of sidebands with a spacing given by the free spectral range (FSR) of the microcavity. This four-wave mixing process can cascade and give rise to frequency combs spanning up to 500 nm in the infrared with a mode spacing of up to 1 THz [9]. The comb modes have been shown to be equidistant to a fractional frequency uncertainty of one part in 10^{17} relative to the pump frequency [9].

Here we present two major advancements that are neccessary preconditions for the monolithic comb generator to be viable in frequency metrology and related applications. First, we demonstrate that it is possible to control two degrees of freedom of the microcavity frequency comb

∗Electronic address: tjk@mpq.mpg.de

FIG. 1: (color online). (a) Photograph of a silicon chip with a row of 750-μm-diameter monolithic toroidal microresonators made of fused silica (white arrow). (b) Spectrum of a frequency comb that has been generated by pumping one of the microresonators with 200 mW laser power (at 1569 nm), exhibiting a mode spacing in the microwave frequency range (86 GHz).

(MFC) spectrum, which is required for full stabilization of the comb spectrum. In contrast to mode locked lasers, one comb parameter can be directly accessed via the frequency of the pump laser (since it is part of the MFC), whereas the mode spacing as second degree of freedom is controlled by changing the optical pathlength of the microcavity via the pump power dependent refractive index change of the microresonator. This type of comb control is very robust, since no moveable elements are involved as in the case of mode-locked femtosecond lasers. The actuators are used to demonstrate full stabilization of a microcavity frequency comb. Second and equally important, we show that smaller mode spacings in the microwave regime can be achieved in monolithic comb generators. This result thus overcomes a drawback [16] of our previous work [9], which exhibited a mode spacing in the THz range that was not amenable to direct detection with photodiodes. Using larger scale microresonators approaching the mm-range, comb spacings of less than 100 GHz are achieved. We show that these combs produce an amplitude modulation in time domain, which is sufficient to directly measure a beat note at the mode spacing frequency. Using this beat note, stabilization of the mode spacing to a microwave frequency standard is demonstrated.

Figure 1 depicts a photograph of this next generation of larger scale monolithic comb generators with an increased diameter of D = 750 μm and a corresponding mode spacing of 86 GHz (optical quality factor Q ≈ 2 · 10^7, optical linewidth 10 MHz). The measured parametric oscillation threshold of 39 mW agrees well with the theoretical value [11] of P_{th} ≈ 2π^2 ·n^2 ·^{D·Aeff}_{λ·n2} ·^1_{Q2} ≈ 32 mW [27] for an effective mode area of A_{eff} ≈ π · (1.5 μm)^2 using n = 1.45 and n_2 = 2.2 · 10^{−20 m2}_W for the linear and nonlinear refractive index of silica. The toroids have been made from microfabricated silica disks with an initial diamameter of 800 μm, while the reflow process for the generation of surface tension induced toroids has been performed by moving the focus of a CO_2-laser beam around the circumference of the silica disks. Coupling of laser light into these resonators is achieved via tapered optical fibers as detailed in prior work [17, 18] yielding coupling efficiencies of more than 95%, an important prerequisite for high circulating energies within the resonator. Fig. 1(b) shows a comb spectrum with 86 GHz mode spacing, which is produced by pumping a 750-μm-diameter microtoroid with 200 mW of continuous wave (cw) power at 1570 nm. The spectral width may be improved by increasing the optical quality factor of the microtoroid (Q-factors of up to 10^9 have been attained in millimeter size microspheres [19, 20]).

Stabilization of the microcavity frequency comb.—The setup to control and stabilize the spectrum of microcavity based frequency combs is depicted in Fig. 2(a). One mode of a toroidal microresonator is pumped with a tunable external cavity diode laser (ECDL) amplified by an erbium doped fiber amplifier (EDFA), leading to the generation of a frequency comb. In contrast to earlier work [12, 21] reporting only phase modulation in the four-wave mixing process, we were able to directly measure the 86- GHz mode spacing beat by sending the comb to a fast photodiode (3 dB cut-off at 50 GHz). To measure the 86 GHz signal, it is mixed down to radio frequency (RF) using a harmonic mixer and the 6th harmonic of a local oscillator around 14.3 GHz. The generated RF-signal and thus the comb spacing is stabilized using a phaselocked loop (PLL) that controls the power launched into the microresonator via the diode current of the EDFA.

The second degree of freedom of the MFC is controlled via the frequency of the pump laser (defining the central mode of the comb), which is phase-locked to an optical reference defined by a mode of a fully stabilized erbium fiber laser based frequency comb with a repetition rate of ≈100 MHz [22]. Fast control on the pump laser frequency is achieved by actuation of the diode current of the ECDL (actuation bandwidth ≈1 MHz). Note that this actuator does not affect the launched pump power, since the subsequent EDFA is operated in saturation, correspondingly amplifying the signal to a constant value. An additional

FIG. 2: (color online). Frequency comb stabilization. (a) Scheme of the experimental setup used for stabilizing a microcavity frequency comb. The comb spacing is stabilized via the pump power launched into the microresonator, while the pump frequency is stabilized by a phase lock to a reference comb. Panel (b) displays a measurement of the mode spacing variation of an MFC (mode spacing 400 GHz, measured with “beat1” and “beat2”). The thin line in the right part of the graph has been measured after activating the stabilization of the MFC. Panel (c) and (d) show in-loop counter measurements of the mode spacing and the pump laser frequency of the stabilized microcavity comb at a gate time of 1 s. The standard deviations for the measured data are 400 μHz (gate time limited) for the mode spacing lock in (c) and 5.7 mHz for the stabilization of the pump laser in (d).

beat note between a MFC mode and a reference comb mode is generated for out-of-loop analysis of the comb stabilization [“Beat 2” in figure 2(a)]. All local oscillators used for stabilization of the MFC as well as the fiber laser comb are referenced to the same in-house hydrogen maser.

The temporal evolution of the mode spacing without stabilization is depicted in Fig. 2(b), measured with a radio frequency counter at a gate time of 1 s. The first part of the data corresponds to the situation where the active feedback to the pump power is disabled. A slow mode spacing drift of approximately 60 kHz/h has been observed, which can be attributed to resonator temperature drifts during the measurement. Additionally, faster fluctuations with a time constant of several seconds, which originate from pump power fluctuations and unstable coupling are present. The fluctuations are dramatically reduced when the lock is activated, as can be seen in figure 2(c). Note that the mode spacing in figure 2(b) and 2(c) has been measuring and stabilized using “beat1” and “beat2” (The experiment has been conducted with a smaller cavity with 400 GHz mode spacing). The recorded beat reveals counter gate time limited fluctuations of less than 1 mHz. Fig. 2(d) depicts the inloop beat of the pump laser, phase-locked to a reference comb mode. An out-of-loop measurement of the stabilized MFC is presented in the last section.

To obtain a better understanding of the mode spacing of MFCs, a measurement of the Allan deviation σ_A(τ) of both the stabilized and free drifting comb spacing has been conducted [Fig. 3] with a fast photodiode (using the resonator with mode spacing of ≈86 GHz). At a gate time of 1 second, the free drifting comb exhibits relative fluctuations of σ_A = 4 × 10^{−8} while the stabilized beat is stable to σ_A = 7 × 10^{−13} relative to the mode spacing frequency. The inset of Fig. 3 shows a spectrum of the stabilized microwave mode spacing beat note, whereby the width of the coherent peak is limited by the resolution of the spectrum analyzer (10 Hz).

FIG. 3: (color online). Allan deviation of the free drifting and the stabilized frequency comb spacing. The inset shows a stabilized microwave beat note signal of the mode spacing at around 86 GHz with a resolution limited coherent spike.

Control parameters of the microcavity frequency comb.—Since the pump laser is part of the frequency comb (similar to the comb generators based on intracavity phase modulators [23]), we can describe the comb modes by ν_m = ν_0 ± m · ν_{ms} (with the pump frequency

FIG. 4: (color online). (a) Dependence of the mode spacing on the power launched into the microcavity. (b) Dependence of the mode spacing on the pump laser frequency (c) Experimental setup for a response measurement of the mode spacing control. (d) Response measurement of the mode spacing control. The cut-off frequency is around 10 kHz.

ν_0, the mode spacing ν_{ms} and m being an integer number). To measure the dependence of the mode spacing ν_{ms} on the pump power P_{in}, one microresonator mode is thermally locked to the pump laser [24] (whereby small fluctuations of the pump detuning are compensated due to the thermally induced frequency shift of the microresonator). This thermal self-locking allows for tuning ranges of tens of GHz without losing the resonance of the microcavity [24]. After thermally locking the microcavity mode to the pump laser we investigate the influence of pump laser frequency ν_0 and power P_{in} on the comb spacing. Using a matrix notation, the two comb parameters can be written as: ( ν_0 ν_{ms} − ν^0_{ms} ) = ( 1 0 γ_ν γ_p ) · ( ν_0 P_{in} ) , (1)

where ν^0_{ms} is the mode spacing at a certain setpoint used for stabilization. The two parameters γ_p and γ_ν describe the influence of the pump laser’s power and frequency on the mode spacing, respectively. They are determined by measuring the mode spacing change when varying the power P_{in} at a constant frequency ν_0 and vice versa. Figure 4(a) and (b) show the result of this measurement yielding γ_p ≈ 20 kHz/mW and γ_ν ≈ 650 Hz/MHz around the chosen setpoint. Thus, having a non-zero γ_p allows for diagonalization of the transfer matrix in equation 1 and consequently independent control of both comb parameters.

The main contribution to the mode spacing change with launched power (cf. Fig. 4b) can be explained by the changed temperature of the resonator through absorped optical power. This temperature change leads to a changed refractive index in silica which affects the optical pathlength of the microresonator modes. The thermal contribution to the mode spacing tuning has been quantified by comparing the mode spacing tunability with the pump power dependent frequency of the microcavity mode. The latter has been measured in the same toroid used for stabilization by scanning the laser over a resonance and measuring the maximum detuning frequency with respect to the cold cavity mode at different powers (see reference [24] for details on thermal effects in microcavites). The maximum resonance shift as a function of pump power has been measured to vary with Γ_p = −46 MHz/mW, which is in good agreement with the measured mode spacing change multiplied by the mode number of γ_p · m = −20 kHz/mW · 2244 ≈ −45 MHz/mW (using m = 2244 for a cavity mode at 193 THz and a mode spacing of 86 GHz). Note that for larger pump power tuning ranges the mode spacing dependence becomes more complex, which may be attributed to the generation of additional sidebands contributing differently to the thermal effect of the microcavity and the influence of cross and self-phase modulation [11].

FIG. 5: (color online). Out-of-loop stability of the microcavity comb (86 GHz mode spacing). (a) Out-of-loop beat note of a sideband of the stabilized MFC with a fiber laser reference comb, measured using the setup in figure 2(a). (b) Distribution of the out-of-loop beat note counter measurement data shown below. The deviation from the expected position is smaller than -11 mHz ± 20 mHz. (c) Counter measurement of the out-of-loop beat note at a gate time of 1 second.

Next the locking bandwidth was investigated using the setup in Fig. 4(c). The control signal for the intracavity power is modulated at varying frequencies and added to the correction signal of the phase-locked loop, while simultaneously measuring the correction signal that tries to compensate the perturbation. The result of the measurement in Fig. 4(d) shows the frequency dependence of the correction signal, exhibiting a 3 dB cut-off at ca. 10 kHz. This measured value is in good agreement with the expected thermal cut-off frequency in silica, which can be estimated by f_c =^κ_{2π·R20} ≈ 16 kHz [25] (with the

thermal diffusivity of silica κ ≈ 9·10^{−7 m2}_s and R ≈ 3 μm being the radius of the toroidal cross section). Thus, the small dimensions of the microcavity makes the thermal response sufficiently fast for the mode spacing stabilization.

Out-of-loop measurements.—To quantify the actual stability of the microcavity comb, an additional out-of-loop beat note of a sideband of the stabilized MFC and the reference comb has been generated and measured. The stability of the out-of-loop beat note has been measured with a RF-counter at a gate time of 1 second and shows a standard deviation of 1.24 Hz [Fig. 5].

Conclusion.—Stabilization of optical frequency combs generated by four-wave mixing in on-chip microresonators has been demonstrated for the first time. It is emphasized that the presented scheme for stabilization does not require any moveable parts and is thus highly mechanically robust. Moreover, generation of microwave beat notes is demonstrated allowing locking of the mode spacing to a frequency reference. The stabilization of a microcavity frequency comb in conjuction with mode spacings in the microwave domain is an important step towards a low cost, small sized frequency comb generator for spectroscopy applications, astrophysical spectrometer calibration [26], arbitrary optical waveform generation, optical distribution of microwave clock signals and high capacity telecommunication.

We thank T. W. Hänsch for discussions and suggestions. T.J.K. acknowledges support via an Independent Max Planck Junior Research Group. This work was funded as part of a Marie Curie Excellence Grant (RG- UHQ) and the DFG funded Nanosystems Initiative Munich (NIM). We thank J. Kotthaus for access to clean room facilities for sample fabrication.

[1] R. Holzwarth, T. Udem, T. W. Hansch, J. C. Knight, W. J. Wadsworth, and P. S. J. Russell, Physical Review Letters 85, 2264 (2000).

[2] S. A. Diddams, D. J. Jones, J. Ye, S. T. Cundiff, J. L. Hall, J. K. Ranka, R. S. Windeler, R. Holzwarth, T. Udem, and T. W. Hansch, Physical Review Letters 84, 5102 (2000).

[3] M. J. Thorpe, K. D. Moll, R. J. Jones, B. Safdi, and J. Ye, Science 311, 1595 (2006).

[4] S. A. Diddams, L. Hollberg, and V. Mbele, Nature 445, 627 (2007).

[5] S. A. Diddams, T. Udem, J. C. Bergquist, E. A. Curtis, R. E. Drullinger, L. Hollberg, W. M. Itano, W. D. Lee, C. W. Oates, K. R. Vogel, et al., Science 293, 825 (2001).

[6] E. Goulielmakis, V. S. Yakovlev, A. L. Cavalieri, M. Uiberacker, V. Pervak, A. Apolonski, R. Kienberger, U. Kleineberg, and F. Krausz, Science 317, 769 (2007).

[7] D. J. Jones, S. A. Diddams, J. K. Ranka, A. Stentz, R. S.

Windeler, J. L. Hall, and S. T. Cundiff, Science 288, 635 (2000).

[8] H. R. Telle, G. Steinmeyer, A. E. Dunlop, J. Stenger, D. H. Sutter, and U. Keller, Applied Physics B-Lasers

And Optics 69, 327 (1999).

[9] P. Del’Haye, A. Schliesser, O. Arcizet, T. Wilken, R. Holzwarth, and T. J. Kippenberg, Nature 450, 1214 (2007).

[10] R. K. Chang and A. J. Campillo, eds., Optical Processes in Microcavities (World Scientific, Singapore, 1996).

[11] T. J. Kippenberg, S. M. Spillane, and K. J. Vahala, Physical Review Letters 93, 083904 (2004).

[12] A. A. Savchenkov, A. B. Matsko, D. Strekalov, M. Mohageg, V. S. Ilchenko, and L. Maleki, Physical Review Letters 93, 243905 (2004).

[13] V. S. Ilchenko and A. B. Matsko, IEEE Journal Of Selected Topics In Quantum Electronics 12, 15 (2006).

[14] I. H. Agha, Y. Okawachi, M. A. Foster, J. E. Sharping, and A. L. Gaeta, Physical Review A 76, 043837 (2007).

[15] A. A. Savchenkov, A. B. Matsko, V. S. Ilchenko, I. Solomatine, D. Seidel, and L. Maleki, arXiv:0804.0263 (2008).

[16] S. T. Cundiff, Nature 450, 1175 (2007).

[17] S. M. Spillane, T. J. Kippenberg, O. J. Painter, and K. J.

Vahala, Physical Review Letters 91, 043902 (2003). [18] M. Cai, O. Painter, and K. J. Vahala, Physical Review Letters 85, 74 (2000).

[19] D. W. Vernooy, V. S. Ilchenko, H. Mabuchi, E. W. Streed, and H. J. Kimble, Optics Letters 23, 247 (1998).

[20] V. B. Braginsky, M. L. Gorodetsky, and V. S. Ilchenko, Physics Letters A 137, 393 (1989).

[21] A. A. Savchenkov, E. Rubiola, A. B. Matsko, V. S.

Ilchenko, and L. Maleki, Optics Express 16, 4130 (2008). [22] P. Kubina, P. Adel, F. Adler, G. Grosche, T. W. Hansch, R. Holzwarth, A. Leitenstorfer, B. Lipphardt, and H. Schnatz, Optics Express 13, 904 (2005).

[23] M. Kourogi, K. Nakagawa, and M. Ohtsu, IEEE Journal Of Quantum Electronics 29, 2693 (1993).

[24] T. Carmon, L. Yang, and K. J. Vahala, Optics Express 12, 4742 (2004).

[25] R. W. Boyd, Nonlinear Optics (Academic Press, 1992). [26] M. T. Murphy, T. Udem, R. Holzwarth, A. Sizmann, L. Pasquini, C. Araujo-Hauck, H. Dekker, S. D’Odorico, M. Fischer, T. W. Hansch, et al., Monthly Notices Of The Royal Astronomical Society 380, 839 (2007).

[27] The same threshold bevaviour can be derived by calculating the power that is needed to shift a microcavity resonance by one linewidth via the static Kerr effect.