arXiv:0712.1481v1 [astro-ph] 10 Dec 2007

Monitoring of FR Cnc Flaring Activity

A.Golovin^{1,2}, M.Andreev^{3,4}, E.Pavlenko^5, Yu.Kuznyetsova^2, V.Krushevska^2, A.Sergeev^{3,4}

1Kyiv National Taras Shevchenko University, Kyiv, Ukraine 2Main Astronomical Observatory of National Academy of Science of Ukraine, Kyiv, Ukraine 3International Center for Astronomical, Medical and Ecological Research of NASU 4 Terskol Branch of Institute of Astronomy RAS, Russia 5Crimean Astrophysical Observatory, Crimea, Nauchnyj, Ukraine astronom_2003@mail.ru, astron@mao.kiev.ua

Being excited by the detection of the first ever-observed optical flare in FR Cnc, we decided to continue photometrical monitoring of this object. The observations were carried out at Crimean Astrophysical Observatory (Crimea, Ukraine; CrAO - hereafter) and at the Terskol Observatory (Russia, Northern Caucasus). The obtained lightcurves are presented and discussed. No distinguishable flares were detected that could imply that flares on FR Cnc are very rare event.

Introduction

FR Cnc is a BY Dra type star, showing its light variations (0.^m17), caused, as assumed, by the presence of star-spots and axial rotation [3, 4, 5].

Very recently Golovin, A., Pavlenko, E., Kuznyetsova, Yu. and Krushevska, V. [2] detected the first ever-observed large optical flare (1.^m02 in B-band, 0.^m49 - V-band, 0.^m21 - R-band, 0.^m14 - I-band) at CrAO.

FR Cnc has unusually short (for such class of objects) rotational period of 0.^d8267. As it was shown in [1], short rotational period allow to expect large flare activity in the star.

In the aim to detect other flares in this object, we decided to continue photometrical monitoring of FR Cnc.

Observations

Observations were carried out by the authors at CrAO during 4 nights on November, 2006 with the help of 38-cm Cassegrain telescope and SBIG ST-9 CCD camera, as well as in Terskol Observatory during 7 nights in March, 2007 using 0.29-m telescope and Apogee-47 Alta CCD camera (see Table 1 for log of observations). All observations were done in B-band as far as the flare amplitude is increasing with decreasing of the wavelength. The duration of each observational run varies from 2 to 7 hours. Calibration process of the obtained frames, comparison and check stars are remain the same as described in [2].

The obtained lightcurve during the course of FR Cnc monitoring in March, 2007, folded with FR Cnc rotational period of 0.8267 days, is shown in Fig. 1.

As it is clearly seen, one-humped 0.^m17 variations with the rotational period are clearly distinguishable, while no flares were detected that could imply that flares is a rare event for FR Cnc and makes this object even more interesting for follow-up observations. Taking into account large amplitude of the flares in short wavelengths, B-band would be recommended, nevertheless, multicolour CCD photometry is highly valuable as well.

Acknowledgements

This work was partly supported by Science & Technology Center in Ukraine, grant #4134.

YSC’14 Proceedings of Contributed Papers A. Golovin et al.

Table 1. Log of Observations

Beginning of the Run (HJD) End of the Run (HJD) Observatory Remarks 2454062.5102 2454062.6133 CrAO 2454065.4893 2454065.5540 CrAO 2454067.4628 2454067.5623 CrAO 2454069.5012 2454069.5440 CrAO 2454171.2453 2454171.4361 Terskol 2454174.3501 2454174.4019 Terskol 2454179.4266 2454179.4571 Terskol Data excluded due to big scatter 2454180.1863 2454180.4691 Terskol 2454181.19303 2454181.3536 Terskol Data excluded due to big scatter 2454182.2395 2454182.4972 Terskol 2454188.4424 2454188.4721 Terskol

Figure 1: Phase Lightcurve of FR Cnc.

References

[1] Dorren J.D., Guinan E.F., Dewarf L.E. ASPCS, V. 64, p. 399 (1994)

[2] Golovin A., Pavlenko E., Kuznyetsova Yu., Krushevska V. IBVS, No. 5748 (2007)

[3] Kazarovets A.V., Samus N.N., Durlevich O.V., et al. IBVS, No. 4659 (1999)

[4] Pandey J.C., Singh, K.P., Sagar R., Drake S.A. IBVS, No. 5351 (2002)

[5] Pandey J.C. Bull. of the Astron. Soc. of India, V. 31, p. 329 (2003)