0.0 0.2 0.4 0.6 0.8 1.0 0.0

0.2

0.4

0.6

0.8

1.0 D (a.u.) (a) 5.8 29.2 52.5

Ψ

z/D 0 10 20 30 40 50 60 600

800

1000

1200

Figure 3

calculation exponetional decay power decay (~D^{-0.17}) (b)

B^c 2(T es la )

D(a.u.)