0 1 1.251.5 2 3 4 5 0

1

2

3

d_1 d2

Inner-bound to the no-CSIT dof region Outer-bound to the no-CSIT dof region Perfect-CSIT dof region

CRC: M_1 = 3 N_1 = 5 M_2 = 3 N_1 = 4

P_2 = (1,3)

P_2’ = (1.25,3) P_2" = (1.5,3)